\begin{table}%t3
\caption{Structures detected in redshift slices with central redshift from 0.15 to 0.70.}\label{tab:candi}
\small
%\centerline
{\begin{tabular}{ccccccccc}
\hline\hline
Slice &  ID  & $\alpha$ & $\delta$ & Min. thres.
& Gen. ID & X-ray ID and $z$ XMM & T-X  & VVDS  \\
\hline
0.10--0.20 (5868) & 0001 & 36.3789 & --4.2424  & 4 & 1  & C1-041/0.14 & 1.3 keV &Y\\
         & 0002 & 36.7981 & --4.1970  & 3 & 2  &             &     &Y    \\
\hline
0.15--0.25 (7848) & 0001 & 36.3746 & --4.6831 & 3  & 3 & C1-025/0.26 & 2.0 keV &Y\\
         & 0002 & 36.5767 & --4.0699 & 3  & (4) &  S           &      &N  \\
         & 0003 & 36.6240 & --4.2523 & 3  & 5 &  S           &    &Y   \\
         & 0004 & 36.8215 & --4.5465 & 3  & (6) & S &  &Y  \\
\hline
0.20--0.30 (9252) & 0001 & 36.8946  & --4.8679  & 4  & 7 & C1-022/0.29 & 1.7 keV&N\\
         & 0002 & 36.2451  & --4.8901  & 3  & 8 & A/M           &     &N   \\
         & 0003 & 36.1364  & --4.2134  & 4  & 9 & C1-044/0.26 & 1.3 keV& \\
         & 0004 & 36.6840  & --4.2315  & 3  & (5) &        &        &Y \\
        & 0005 & 36.8435  & --4.5570  & 4  & (6) &  & &Y\\
         & 0006 & 36.5928  & --4.0801  & 4  & (4) & S            &     &N  \\
\hline
0.25--0.35 (10570) & 0001 & 36.3166 & --4.7515 & 3  & 10 & MA& &Y \\
         & 0002 & 36.9117 & --4.8594 & 4  & (7) &  &  &N \\
         & 0003 & 36.6381 & --4.8759 & 4  & 11 & M           &       &N \\
         & 0004 & 36.8416 & --4.5810 & 4  & 6 & C1-013/0.31 & 1.0 keV&Y \\
      & 0005 & 36.6121 & --4.0741 & 3  & (4) &   &   &N  \\
         & 0006 & 36.6104 & --4.5286 & 3  & 12 & S &    &Y \\
\hline
0.30--0.40 (9973) & 0001 & 36.2974 & --4.7511 & 3  & (10) & A/M & &Y \\
         & 0002 & 36.6445 & --4.8804 & 4  & (11) & M &  &N\\
         & 0003 & 36.8090 & --4.6339 & 4  & (6) & G/M & &Y \\
         & 0004 & 36.6215 & --4.0689 & 4  & 4 &  XLSS014/W05/0.34 & &N  \\
\hline
0.35--0.45 (8248) & 0001 & 36.1413 & --4.8965 & 4  & 13 & A/M & &N \\
         & 0002 & 36.6542 & --4.9432 & 4  & (11) & G & &N \\
         & 0003 & 36.7937 & --4.6294 & 3  & (6) & G/M/S &&Y  \\
         & 0004 & 36.6156 & --4.0665 & 3  & (4) & S &  &N\\
\hline
0.40--0.50 (8302) & 0001 & 36.1201 & --4.8502 & 4  & (13) & A & &N\\
         & 0002 & 36.6735 & --4.9467 & 4  & (11) & G & &N \\
         & 0003 & 36.0884 & --4.0633 & 3  & (14) &  &  &N\\
         & 0004 & 36.6258 & --4.0680 & 3  & (4) & S & &N \\
\hline
0.45--0.55 (9216) & 0001 & 36.1152 & --4.8328 & 4  & (13) & A & &N\\
         & 0002 & 36.6799 & --4.0610 & 3  & (4) & G & &N\\
         & 0003 & 36.0798 & --4.0684 & 4  & 14 &  & &N \\
         & 0004 & 36.3842 & --4.2726 & 4  & 15 & S  &  &Y\\
         & 0005 & 36.8975 & --4.3768 & 3  & 16 &  &  &Y\\
         & 0006 & 36.8481 & --4.6202 & 3  & 17 & G/M & &Y \\
\hline
0.50--0.60 (10201) & 0001 & 36.1202 & --4.8557 & 4  & (13) & A &  &N\\
         & 0002 & 36.6990 & --4.0559 & 3  & (4) &  &  &N\\
         & 0003 & 36.0758 & --4.1999 & 4  & 18 & M &  &N\\
         & 0004 & 36.3762 & --4.2655 & 4  & (15) &  S  &  &Y\\
         & 0005 & 36.8334 & --4.4982 & 3  & (19) & M &  &Y\\
         & 0006 & 36.2840 & --4.7423 & 3  & 20 & A/M & &N\\
\hline
0.55--0.65 (10845) & 0001 & 36.1366 & --4.8951 & 3  & (13) & A & &N  \\
         & 0002 & 36.3825 & --4.2687 & 3  & (15) & S &  &Y\\
         & 0003 & 36.4645 & --4.4997 & 3  & 21 &  &  &Y\\
         & 0004 & 36.8646 & --4.5484 & 4  & 19 &  &  &Y\\
\hline
0.60--0.70 (10224) & 0001 & 36.6686 & --4.5096 & 4  & 22 & S &  &Y\\
         & 0002 & 36.2364 & --4.2232 & 3  & (23) &  &  &N\\
\hline
0.65--0.75 (9243) & 0001 & 36.0853 & --4.7942 & 3  & 24 & A & &N \\
         & 0002 & 36.4815 & --4.0820 & 3  & 25 & M/S & &N \\
         & 0003 & 36.7546 & --4.0752 & 3  & 26 &  &  &N\\
         & 0004 & 36.2089 & --4.2167 & 4  & 23 &  &  &N\\
         & 0005 & 36.6585 & --4.5160 & 4  & (22) & S &  &Y\\
\hline
\end{tabular}}
\medskip
Structures detected along with their redshift slice (and the total number of
 galaxies inside the slice), structure ID, 
coordinates, minimum detection level, general identification, X-ray association
or a potential explanation of the absence of X-ray 
detection (centre of the structure located in A: the Absence zone, G: 
a Gap between two X-ray pointings, M: a region 
strongly affected by masked CFHTLS areas, S: a single XMM field 
where the exposure time was Short, E: a region with an X-ray detection very 
close to 
the CFHTLS D1 field Edge), X-ray temperature when available, and VVDS
available redshifts. Some structures
show up at almost the same positions in several slices: the secondary 
detections are then labelled by the same number but flagged by parentheses
(the unflagged number is the detection made with the highest signal-to-noise). 
W05 refers to Willis et~al. (\cite{Willis2005}) and A05 to Andreon et~al. (\cite{Andreon2005}). 
\end{table}