\begin{table}%t2
%\centering
\par
\caption{Number of peaks detected per square degree in 50 GalICS fields 
(averaged over the 50 available fields) and in real D1 fields (rescaled to 1 deg$^2$) 
with respect to redshift and to a given threshold. 
We only give the non-overlapping redshift slices.}
\small
\begin{tabular}{ccccc}
\hline\hline
 $z$  & $\geq$3$\sigma$ Gal& $\geq$4$\sigma$ Gal & $\geq$3$\sigma$ D1 & 
$\geq$4$\sigma$ D1 \\
\hline
% 0.1-0.2  & 5.2$\pm$0.6 &  4.6$\pm$0.6 & 2.5 &  1.25\\ 
%0.15-0.25 &  & & 5.0 &  0 \\
 0.2--0.3  & $7.0\pm0.8$ &  $6.2\pm0.8$ & 7.5 &  5.0\\ 
%0.25-0.35 &  & & 7.5 &  3.75\\
 0.3--0.4  & $8.0\pm0.8$ &  $6.8\pm0.8$ & 5.0 &  3.75\\ 
%0.35-0.45 &   & & 5.0 &  2.5\\
 0.4--0.5  & $8.1\pm0.9$ &  $6.8\pm1.0$ & 5.0 &  1.25\\ 
%0.45-0.55 &  & & 7.5 &  3.75\\
 0.5--0.6  & $8.3\pm0.9$ &  $6.6\pm1.0$ & 7.5 &  3.75\\ 
%0.55-0.65 &  & & 5.0 &  1.25\\
 0.6--0.7  & $8.0\pm0.9$ &  $6.0\pm1.1$ & 2.5 &  1.25\\
%0.65-0.75 &  & & 6.25 &  2.5\\
 0.7--0.8  & $7.6\pm1.1$ &  $5.4\pm0.7$ & 5.0 &  1.25\\
%0.75-0.85 & &  & 7.5 &  1.25\\
 0.8--0.9  & $6.9\pm0.7$ &  $4.7\pm0.8$ & 6.25 &  2.5 \\ 
%0.85-0.95 & &  & 6.25 &  2.5\\
 0.9--1.0  & $6.3\pm0.6$ &  $4.3\pm0.6$ & 6.25 &  2.5\\ 
%0.95-1.05 & &  & 3.75 &  2.5\\
 1.0--1.1  & $5.6\pm0.6$ &  $3.6\pm1.0$ & 3.75 &  2.5\\ 
%1.05-1.15 &  & & 3.75  & 0\\
 1.1--1.2  & $4.9\pm0$.6 &  $3.0\pm0.5$ & 5.0 &  2.5\\ 
%1.15-1.25 &  & & 7.5 &  5.0\\
 1.2--1.3  & $5.4\pm0$.5 &  $3.2\pm0.6$ & 6.25 &  5.0\\ 
%1.25-1.35 & &  & 5.0 &  2.5 \\
% 1.3-1.4  & 4.8$\pm$0.6 &  2.8$\pm$0.4 & 2.5 &  1.25\\ 
% 1.35-1.5 & 4.9$\pm$0.6 &  2.9$\pm$0.5 &  3.75 &  0 \\ 
\hline
\end{tabular}
\label{tab:area}
\end{table}