\begin{table}%t2
\caption{Dimensions (in arcmin unless ratios) of edge-on galaxies in 
the van~der~Kruit \&  Searle sample as measured from the Sloan Digital
Sky Survey and from the Digital Sky Survey~2 (red). The radius~$R_{\rm max}$
is the truncation radius found by van~der~Kruit \&  Searle and has been
listed for comparison. Values for radii and axis ratios have been rounded
off to one~decimal, but their ratios have been calculated before that.}
\label{Table2}      
%\centering
\small           
\begin{tabular}{l c c c c c c c c}    
\hline\hline                 
Galaxy & $R_{\rm max}$ & $R_{\rm shallow}$ & $R_{\rm deep}$ & 
\underline{$R_{\rm deep}$} &  
\underline{$R_{\rm deep}\ \ \ $} & $(a/b)_{\rm shallow}$  
& $(a/b)_{\rm deep}$ & \underline{$(a/b)_{\rm deep}\ \ \ $} \\ 
 & ($'$) & ($'$)  & ($'$) & $R_{\rm max}\ \ \ $ &  
$R_{\rm shallow}$ & 
&  & $(a/b)_{\rm shallow}$ \\    
\hline                     
\multicolumn{9}{c}{SDSS} \\
NGC 4013 & 2.7 & 2.5 & 2.8 & 1.03 & 1.10 & 3.2 & 2.3 & 1.41 \\
NGC 4217 & 3.3 & 3.1 & 3.4 & 1.03 & 1.08 & 3.4 & 2.8 & 1.22 \\
NGC 4244 & 9.5 & 8.5 & 9.3 & 0.98 & 1.09 & 8.0 & 7.0 & 1.15 \\
NGC 4565 & 8.3 & 8.1 & 8.2 & 0.99 & 1.02 & 7.3 & 6.0 & 1.20 \\
NGC 5023 & 3.3 & 2.8 & 3.3 & 1.00 & 1.19 & 6.2 & 5.8 & 1.07 \\
NGC 5907 & 6.0 & 5.8 & 6.1 & 1.02 & 1.06 & 7.3 & 6.3 & 1.16 \\
NGC 7814 & 4.0 & 3.6 & 4.3 & 1.07 & 1.18 & 2.1 & 2.0 & 1.03 \\ 
\hline                                  
\multicolumn{9}{c}{DSS2 (red)} \\
NGC \ \ 891 & 7.5 & 7.0 & 7.4 & 0.99 & 1.07 & 5.8 & 3.4 & 1.49 \\
NGC 4013 & 2.7 & 2.5 & 2.7 & 1.00 & 1.10 & 3.5 & 2.9 & 1.23 \\
NGC 4217 & 3.3 & 3.2 & 3.3 & 1.00 & 1.04 & 3.4 & 3.0 & 1.15 \\
NGC 4244 & 9.5 & 8.4 & 8.7 & 0.92 & 1.03 & 7.3 & 6.8 & 1.06 \\
NGC 4565 & 8.3 & 8.0 & 8.2 & 0.99 & 1.04 & 7.1 & 5.9 & 1.21 \\
NGC 5023 & 3.3 & 2.5 & 3.2 & 0.97 & 1.30 & 5.9 & 6.3 & 0.95 \\
NGC 5907 & 6.0 & 5.7 & 6.1 & 1.02 & 1.07 & 8.1 & 7.4 & 1.10 \\
NGC 7814 & 4.0 & 2.7 & 3.8 & 0.95 & 1.44 & 2.4 & 2.3 & 1.05 \\
\hline
\end{tabular}
\end{table}