\begin{table}%t2
\caption{Selection cuts used for the analysis of air shower events. The image
amplitude (Size) is given in photo-electrons (p.e.), $E_{\rm max}$
corresponds to the maximum reconstructed event energy, MRSW and MRSL
represent the mean scaled reduced width and length parameters, and~$\theta^2_{\rm cut}$ is the maximum squared angular distance with respect to the target position. The tail cuts represent the image cleaning thresholds applied. For details see \citet{Crab}.}\label{table_cuts}
%%\centering

\small
\begin{tabular}{ccccccc}
\hline\hline
\noalign{\smallskip}
Cuts & Size   & $E_{\rm max}$& MRSW & MRSL & $\theta^2_{\rm cut}$ & Tail cuts\\
     & [p.e.] & TeV          &      &      & $\rm [deg^2]$        & [p.e.]\\
\hline
Standard   & $>$80 & 100 & $[-2, 0.9]$  & $[-2, 2]$ & 0.0125 & 5/10\\
Low energy & $>$40 & 0.5 &$[-2, 0.75]$ & $[-2, 1.4]$ & 0.024  & 4/7 \\
\hline
\end{tabular}
\end{table}