\begin{table}%t3
\caption{Photometric results for SB~1/SB~2. The upper energy level of the transition is given in the third~column. The $x$ and $y$~peak position offsets are relative to the 1---0~S(1)~peak position.}
\label{sb1_fluxes}
\small%%\centerline

{
\begin{tabular}{l@{~~~}r@{~~~}r@{}rrrr}
\hline \hline 
\noalign{\smallskip}
{line} & {$\lambda$} &{$T$} &{total~flux~$^{\ast}$} &{peak~flux~$^{\dagger}$} &{$x$~offset} &{$y$~offset}\\
&{($\mu$m)} &{(K)} &{} &{} &{(arcsec)} &{(arcsec)}\\
\hline
{(1,0)~S(7)}  &{1.747} &{12817} &{13.4} &{2.9} &{--0.02} &{--0.07} \\
{(1,0)~S(3)}  &{1.957} &{8365}  &{103.8}&{17.5}&{--0.05} &{0.07}  \\
{(1,0)~S(2)}  &{2.033} &{7584}  &{28.1} &{4.9} &{0.04}  &{0.08}  \\
{(2,1)~S(3)}  &{2.073} &{13890} &{10.1} &{2.8} &{$\cdot\cdot\cdot$} &{$\cdot\cdot\cdot$} \\
{(1,0)~S(1)}  &{2.121} &{6956}  &{91.7} &{13.7}&{0.00}  &{0.00}  \\
{(1,0)~S(0)}  &{2.223} &{6471}  &{13}   &{3.0} &{$\cdot\cdot\cdot$} &{$\cdot\cdot\cdot$} \\
{(2,1)~S(1)}  &{2.247} &{12550} &{5.6}  &{2.0} &{$\cdot\cdot\cdot$} &{$\cdot\cdot\cdot$} \\
{(1,0)~Q(1)}  &{2.406} &{6149}  &{58.4} &{14.1}&{0.04} &{0.08} \\
{(1,0)~Q(3)}  &{2.423} &{6956}  &{56.6} &{9.7} &{0.10} &{0.06} \\
{(1,0)~Q(4)}  &{2.437} &{7584}  &{13.4} &{5.3} &{0.08} &{0.05} \\
{(1,0)~Q(5)}  &{2.454} &{8365}  &{29.9} &{11.2}&{$\cdot\cdot\cdot$} &{$\cdot\cdot\cdot$} \\
{(1,0)~Q(6)}  &{2.475} &{9286}  &{9.3}  &{3.0} &{$\cdot\cdot\cdot$} &{$\cdot\cdot\cdot$} \\
\hline
\end{tabular}}
\medskip
$\ast$  Units of Units of $10^{-18}$~W~m$^{-2}$. The 1$\sigma$~flux measurement uncertainty is 
2.8~$\times$ 10$^{-18}$~W~m$^{-2}$ and 5.6~$\times$ 10$^{-18}$~W~m$^{-2}$ beyond 2.4~$\mu$m. \\
$\dagger$  Units of $10^{-18}$~Wm$^{-2}$~arcsec$^{-2}$. The 1$\sigma$~noise level is 
1.0~$\times$ 10$^{-18}$~W~m$^{-2}$~arcsec$^{-2}$.
\end{table}