\begin{table}%t7
\caption{New {\em INTEGRAL} sources detected through our monitoring program.
We give the source position (J2000.0) with its 90\%\ confidence error,
whether the source was detected by JEM-X~(J) and/or IBIS/ISGRI~(I) or not, and the
reference in which the detection was first noted. References: [1]~Kuulkers et~al.\ (\cite{Kuulkers2006c});
[2]~this paper; [3]~Turler et~al.\ (\cite{Turler2006}); [4]~Chenevez et~al.\ (\cite{Chenevez2006b}).}
\small%%\centerline

{
\begin{tabular}{l|ccccc}
\hline\hline
 & RA & Dec & err & J/I? & Reference \\
\multicolumn{1}{l|}{Source} & \multicolumn{2}{c}{(degrees)} &  \multicolumn{3}{c}{} \\
\hline
IGR~J17354$-$3255 & 263.854 & $-$32.922 & 4$'$ & no$^{a}$/yes & [1] \\
IGR~J17454$-$2703 & 266.329 & $-$27.039 & 1$'$ & yes/no & [2] \\
IGR~J17453$-$2853 & 266.328 & $-$28.891 & 2$'$ & no/yes & [2] \\
IGR~J17536$-$2339 & 268.409 & $-$23.654 & 4$'$ & no$^{b}$/yes & [3] \\
IGR~J17541$-$2252 & 268.517 & $-$22.871 & 4$'$ & no$^{b}$/yes & [3] \\
IGR~J17456$-$2901b & 266.412 & $-$29.029 & 2$'$ & yes/yes & [4] \\
\hline
\end{tabular}}
\smallskip
  $^{a}$~JEM-X instrument was off.  $^{b}$~Not in the JEM-X field of view.
\label{new}
\end{table}