\begin{table}%T7
%\centering
\par
\caption{Fractions of absorbed  sources  
         in different X-ray luminosity bins based in Fig.~\ref{3Lx_plot}c. Only  objects with $N_{\rm{H}}> 2\times \Delta N_{\rm{H}}$ are selected.} \label{absorbed} 
 \begin{tabular}{cccc}\hline\hline  
 & $ 43 \le {\rm log}(L_{\rm{X}}) < 44$ & $ 44 \le {\rm log}(L_{\rm{X}}) < 45$ 
 & ${\rm log}(L_{\rm{X}}) \ge 45$ \\ \hline 
type I & 0\% (0/19) &10\% (4/42) &0\% (0/8) \\ 
type II & 43\% (6/14) &58\% (7/12) &33\% (1/3) \\\hline 
 \end{tabular} 
\end{table}