\begin{table}%t2
\caption{\label{obsparam}Parameters inferred directly from observation of the two sequential flares in AR9893/9901 and parameters derived from the observations.}
\small%\centering
\par
\begin{tabular}{l|cccc}
\hline\hline
&\multicolumn{4}{c}{Observational parameters}\\
\hline
&\multicolumn{4}{c}{Flare 2}\\
 &GOES M&GOES C &RHESSI&Radio\\
\hline
 Peak temperature (MK) &7& 10 & -- & -- \\
 Peak E Measure ($10^{49}$~cm$^{-3}$)& 0.2 & 0.05 & -- & -- \\
 Peak photon spectral index ($\gamma$)& -- & -- & -- & --  \\
 Magnetic field (Gauss)& -- & -- & -- & --  \\
 Razin parameter ($\alpha$)& -- & -- & -- & -- \\
 Length ($10^9$~cm)& -- & -- & -- & 4.0 \\
 footpoint area ($10^{17}$~cm$^2$)& -- & -- & -- & 2.5  \\
 \cline{2-5}
 &\multicolumn{4}{c}{Flare 3}\\
  Peak temperature (MK)& 16 & 16 & 35 & -- \\
 Peak E Measure ($10^{49}$~cm$^{-3}$)& 5.0 & 2.0 & 3.5 & --\\
 Peak photon spectral index ($\gamma$)&-- & -- & 5.9 & 5.1 \\
 Magnetic field (Gauss)& -- & -- & --&150\\
 Razin parameter ($\alpha$)& -- & -- & -- & 0.27\\
 Length ($10^9$~cm)& -- & -- & 4.5 & 2.9 \\
 footpoint area ($10^{17}$~cm$^2$)& -- & -- & 2.0 & 2.5\\
 \cline{1-5}
  &\multicolumn{4}{c}{Derived parameters}\\
  \cline{1-5}
   &\multicolumn{4}{c}{Flare 2}\\
  Column density $10^{19}$~cm$^{-2}$ &9.0&4.5&--&--\\
Electron Number (electrons/s) &--&--&--&--\\
Power (erg/s)&--&--&--&--\\
Beam evaporation $10^{19}$~cm$^{-2}$ &&&&\\
Conductive evaporation $10^{19}$~cm$^{-2}$& 6.9 & 14.0 & -- &\\
Radiative losses (erg/s)&$1\times10^{26}$ & $3\times10^{25}$ & -- & -- \\
Conductive losses (erg/s)&$ 2.2\times10^{26}$ & $7.9\times10^{26}$ & -- & -- \\
Stopping energy (keV)& 18.6 & 26.4 & -- & -- \\
\cline{2-5}
 &\multicolumn{4}{c}{Flare 3}\\
 Column density $10^{19}$~cm$^{-2}$ & 35.0 & 22.0 & 9.3 & 5.0\\
Electron Number (electrons/s) & -- & -- & $1.4\times 10^{36}$ & $5.6 \times 10^{34}$ \\
Power (erg/s)& -- & -- & $7.0 \times10^{27}$ & --\\
Beam evaporation $10^{19}$~cm$^{-2}$ & -- & -- & 9.7 &\\
Conductive evaporation $10^{19}$~cm$^{-2}$& 36.0 & 36.0 & 170 & -- \\
Stopping energy (keV)& 52.0 & 41.0 & 27.8 & 19.6 \\
\hline
\end{tabular}
\end{table}