\begin{table}%t1
\caption{\label{gyrofitpar}Parameters obtained from fitting model spectrum to NoRP data.}
\small%\centering
\par
\begin{tabular}{lllll}
\hline
\hline
Time & Spectral index $\gamma$ &$A(t) \times 1{\rm e}30$ & $B$ in Gauss  & $\alpha$ \\
\hline
00:01:10 & 4.6 & 2.6 &145 & 0.25 \\ 
00:02:10 & 3.9 & 7.9 &145 & 0.27 \\
00:03:10 & 3.8 & 10.5 &140 & 0.28 \\
00:04:10 & 3.8 & 10.5 &140 & 0.29 \\
00:05:10 & 4.0 & 5.8 &190 & 0.29 \\
00:06:10 & 4.5 & 8.0 &200 & 0.29 \\
00:07:10 & 4.1 & 8.7 &180 & 0.29 \\
00:08:10 & 3.3 & 4.0 &140 & 0.30 \\
00:09:10 & 3.1 & 3.8 &120 & 0.30 \\
00:10:10 & 4.1 & 18.0 &145 & 0.27\\
\hline
\end{tabular}
\end{table}