\begin{table}%t2
%\centering
\par
\small\caption{Variability data for the~$\gamma$~Doradus stars. 
Frequencies are in \cd, amplitudes in mmag and phases in degrees.
The quoted errors on the frequencies, amplitude ratios and phase 
differences are standard deviations on the values determined from extensive 
simulations (see text).}\label{tab.gd}
\begin{tabular}{cccrrrr}
\hline\hline\noalign{\smallskip}
ID & $\nu_{i}$ & $\nu$ & $A_{B}$ & $S$/$N$$_{B}$ & $A_{I}$/$A_{B}$ & $\phi_{I}-\phi_{B}$ \\
\noalign{\smallskip} \hline
V11& $\nu_{1}$ & 1.165(1) & 7.93 & 6.78 & 0.41(4)  & --1(5)  \\
   & $\nu_{2}$ & 1.270(1) & 5.12 & 4.37 & 0.40(6)  &  6(8) \\
   & $\nu_{3}$ & 1.400(2) & 8.58 & 7.34 & 0.40(3)  &  3(5)  \\ 
V12& $\nu_{1}$ & 1.395(4) & 9.26 & 5.84 & 0.70(6)  &  30(6)  \\
V13& $\nu_{1}$ & 0.830(1) & 8.10 & 6.00 & 0.39(4)  &  13(6) \\
V14& $\nu_{1}$ & 0.758(4) & 2.130& 4.57 & 0.68(13) &  33(12) \\
   & $\nu_{2}$ & 0.870(1) &17.750&38.08 & 0.43(2)  &  --8(2)  \\
   & $\nu_{3}$ & 0.927(1) & 4.090& 8.77 & 0.31(8)  &  88(18) \\
V15& $\nu_{1}$ & 0.495(4) & 3.60 & 3.16 & 0.46(13) &  35(17) \\
   & $\nu_{2}$ & 0.614(1) &14.93 &13.10 & 0.48(2)  &   4(2)  \\
   & $\nu_{3}$ & 1.130(1) & 6.28 & 5.51 & 0.45(4)  & 131(5)  \\
V16& $\nu_{1}$ & 0.474(20) & 9.599& 5.02 & 0.29(3)  &  14(13) \\
   & $\nu_{2}$ & 0.795(1) &20.603&10.78 & 0.52(2)  & --13(2)  \\
   & $\nu_{3}$ & 0.918(3) &11.459& 6.00 & 0.49(4)  &   1(4)  \\
   & $\nu_{4}$ & 1.730(13) & 6.144& 3.21 & 0.73(11) &  --4(8)  \\
V17& $\nu_{1}$ & 0.136(1) &10.875& 7.64 & 0.68(4) &   21(3)  \\
   & $\nu_{2}$ & 0.606(1) &28.233&19.85 & 0.46(2) &    4(2)  \\
   & $\nu_{3}$ & 0.645(7) &15.658&11.01 & 0.51(3) &  --11(3)  \\
   & $\nu_{4}$ & 1.268(1) & 7.362& 5.17 & 0.55(5) &   --3(5)  \\
   & $\nu_{5}$ & 1.537(2) & 7.213& 5.07 & 0.35(11) &  28(15) \\
   & $\nu_{6}$ & 2.439(1) & 5.711& 4.01 & 0.65(8) &   --2(7) \\
V18& $\nu_{1}$ & 0.206(1) & 8.939& 9.51 & 0.80(4) &  --15(3) \\
   & $\nu_{2}$ & 0.674(2) & 3.767& 4.01 & 0.96(11)&  --14(6)\\
V19& $\nu_{1}$ & 0.156(1) & 7.190& 6.13 & 0.56(4) &    1(4) \\
   & $\nu_{2}$ & 0.442(2) &15.774&13.44 & 0.51(2) &    1(2) \\
   & $\nu_{3}$ & 0.583(1) &20.767&17.70 & 0.39(2) &    0(3) \\
   & $\nu_{4}$ & 1.344(3) & 6.928& 5.90 & 0.51(5) &  --27(5) \\
   & $\nu_{5}$ & 1.593(5) & 6.902& 5.88 & 0.51(6) &    5(6) \\
V20& $\nu_{1}$ & 0.842(25) & 7.610&11.23 & 0.43(5) &  --28(7) \\
   & $\nu_{2}$ & 0.883(1) & 9.963&14.70 & 0.66(5) &   --2(3) \\
   & $\nu_{3}$ & 1.701(16) & 3.011& 4.44 & 0.47(8) &  --28(11)\\
V21& $\nu_{1}$ & 0.503(1) & 5.069& 3.50 & 0.53(9) &    4(15)\\
   & $\nu_{3}$ & 0.648(1) &17.793&12.30 & 0.40(2) &  --15(2) \\
   & $\nu_{3}$ & 1.740(1) & 5.434& 3.76 & 0.60(5) &   29(6) \\
V22& $\nu_{1}$ & 0.700(1) &14.214& 6.18 & 0.44(3) &   --8(4) \\
   & $\nu_{2}$ & 1.378(1) &12.684& 5.52 & 0.42(3) &    2(4) \\
V23& $\nu_{1}$ & 1.168(3) & 9.616& 6.35 & 0.47(4) &    1(5) \\
   & $\nu_{2}$ & 1.260(3) &14.415& 9.52 & 0.52(3) &   12(3) \\
V24& $\nu_{1}$ & 0.916(1) &14.458&12.25 & 0.45(3) &   16(5) \\
V25& $\nu_{1}$ & 1.178(1) &14.747&10.84 & 0.60(3) &   12(2) \\
   & $\nu_{2}$ & 1.987(2) & 7.055& 5.19 & 0.50(5) &  --18(8)\\
\hline
\noalign{\smallskip}
\end{tabular}
\end{table}