\begin{table}%t2
%\centering
\par
  \caption{\label{table:identical}Compilation of spectral line pairs with identical line opacities.
  }
  \begin{tabular}{lcccc}
    \hline\hline
         Ion & Wavelength   &  Excitation  &  $\log(gf)$ & $\bar g_{\rm eff}$ \\
             &   (nm)       & potential (eV) &             &        \\
    \noalign{\smallskip}
    \hline
    \noalign{\smallskip}
\ion{Fe}{i} &   400.560 &    4.186 &   --2.131 &   2.0000 \\
\ion{Fe}{i} &   453.894 &    4.186 &   --2.131 &   0.8333 \\
\ion{Fe}{i} &   402.473 &    3.241 &   --0.710 &   0.6250 \\
\ion{Fe}{i} &   408.530 &    3.241 &   --0.710 &   1.7083 \\
\ion{Ti}{i} &   406.509 &    1.053 &   --0.760 &   1.5000 \\
\ion{Ti}{i} &   469.876 &    1.053 &   --0.760 &   1.0000 \\
\ion{V}{i} &   410.516 &    0.267 &   --0.130 &   1.5000 \\
\ion{V}{i} &   440.851 &    0.267 &   --0.130 &   1.4667 \\
\ion{Fe}{i} &   412.180 &    2.832 &   --1.300 &   0.6667 \\
\ion{Fe}{i} &   899.956 &    2.832 &   --1.300 &   1.5000 \\
\ion{Na}{i} &   421.606 &    2.104 &   --2.350 &   1.1000 \\
\ion{Na}{i} &   454.518 &    2.104 &   --2.350 &   1.1667 \\
\ion{Fe}{i} &   428.582 &    3.640 &   --1.780 &   1.1667 \\
\ion{Fe}{i} &   496.870 &    3.640 &   --1.780 &   0.8333 \\
\ion{Ca}{i} &   435.508 &    2.709 &   --0.430 &   1.0000 \\
\ion{Ca}{i} &   452.693 &    2.709 &   --0.430 &   1.0000 \\
\ion{Fe}{i} &   443.834 &    3.686 &   --1.630 &   2.5000 \\
\ion{Fe}{i} &   466.806 &    3.686 &   --1.630 &   1.7500 \\
\ion{Mn}{i} &   445.301 &    2.941 &   --0.490 &   1.5000 \\
\ion{Mn}{i} &   473.909 &    2.941 &   --0.490 &   0.8000 \\
\ion{Fe}{i} &   456.531 &    3.274 &   --2.510 &   2.0000 \\
\ion{Fe}{i} &   479.125 &    3.274 &   --2.510 &   0.5000 \\
\ion{Fe}{i} &   457.982 &    3.071 &   --2.830 &   1.7500 \\
\ion{Fe}{i} &   718.915 &    3.071 &   --2.830 &   1.0000 \\
\ion{Fe}{i} &   461.929 &    3.603 &   --1.120 &   1.8333 \\
\ion{Fe}{i} &   463.801 &    3.603 &   --1.120 &   1.7917 \\
\ion{Fe}{i} &   463.585 &    2.845 &   --2.420 &   2.2500 \\
\ion{Fe}{i} &   635.503 &    2.845 &   --2.420 &   1.0000 \\
\ion{Ti}{i} &   469.133 &    1.067 &   --0.840 &   1.1667 \\
\ion{Ti}{i} &   586.645 &    1.067 &   --0.840 &   1.1667 \\
\ion{Fe}{i} &   480.065 &    4.143 &   --1.260 &   1.0000 \\
\ion{Fe}{i} &   518.792 &    4.143 &   --1.260 &   1.0000 \\
\ion{Si}{i} &   540.466 &    5.614 &   --0.530 &   2.0000 \\
\ion{Si}{i} &   548.898 &    5.614 &   --0.530 &   2.0000 \\
\ion{Si}{i} &   540.466 &    5.614 &   --0.530 &   2.0000 \\
\ion{Si}{i} &   623.732 &    5.614 &   --0.530 &   2.0000 \\
\ion{Si}{i} &   540.985 &    5.616 &   --0.690 &   2.0000 \\
\ion{Si}{i} &   624.447 &    5.616 &   --0.690 &   2.0000 \\
\ion{Si}{i} &   548.898 &    5.614 &   --0.530 &   2.0000 \\
\ion{Si}{i} &   623.732 &    5.614 &   --0.530 &   2.0000 \\
\ion{Fe}{i} &   560.294 &    3.430 &   --0.851 &   0.7500 \\
\ion{Fe}{i} &   565.853 &    3.430 &   --0.851 &   2.2500 \\
\ion{Si}{i} &   565.492 &    5.614 &   --0.930 &   2.0000 \\
\ion{Si}{i} &   612.502 &    5.614 &   --0.930 &   2.0000 \\
    \hline
  \end{tabular}
\end{table}