\begin{table}
\caption{Squared visibilities measured with VINCI on $\eta$~Car.
The seeing in the $K$ band at the time of the observation is given as the
FOV with the UTs (see Sect.~\ref{fov_uts}). $N$ is the number of processsed interferograms,
$B$ the baseline length, and Az. the azimuth angle of the projected baseline (North~= 0$^\circ$, East~= 90$^\circ$).
The squared visibility values and error bars are expressed in percents. The statistical and systematic
(from the calibrator star estimated angular size) error contributions are given separately. \label{table_vis}}
\begin{tabular}{cccrrrrl}
\hline \hline
\noalign{\smallskip}
JD$~- 2.45\times 10^6$ & Stations & FOV ($''$) & $N$ & $B$~(m) & Az.~($\deg$) & $V^2 \pm$ stat. $\pm$ syst. (\%) & Calibrators\\
\hline\noalign{\smallskip}
2~216.8643 & UT1-UT3 & 0.15 & 35 & 96.350 & 179.21 & $ 0.50 \pm 0.04 \pm 0.01 $ & $\gamma^{2}$~Vol \\
2~216.8666 & UT1-UT3 & 0.15 & 38 & 96.353 & 179.79 & $ 0.45 \pm 0.07 \pm 0.01 $ & $\gamma^{2}$~Vol \\
2~246.8287 & UT1-UT3 & 0.37 & 108 & 95.906 & 10.59 & $ 1.01 \pm 0.11 \pm 0.03 $ & $\gamma^{2}$~Vol. $\beta$~Car \\
2~246.8310 & UT1-UT3 & 0.37 & 73 & 95.857 & 11.13 & $ 0.85 \pm 0.18 \pm 0.02 $ & $\gamma^{2}$~Vol. $\beta$~Car \\
2~302.8796 & E0-G0 & 1.40 & 183 & 14.264 & 102.33 & $ 21.19 \pm 1.98 \pm 0.05 $ & HR~4630 \\
2~302.8851 & E0-G0 & 1.40 & 147 & 14.139 & 104.15 & $ 19.96 \pm 2.27 \pm 0.05 $ & HR~4630 \\
2~304.8225 & UT1-UT3 & 0.12 & 55 & 85.216 & 46.55 & $ 2.36 \pm 0.10 \pm 0.05 $ & HR~4546 \\
2~304.8239 & UT1-UT3 & 0.12 & 203 & 85.033 & 46.87 & $ 2.00 \pm 0.06 \pm 0.04 $ & HR~4546 \\
2~451.5692 & E0-G1 & 1.40 & 83 & 62.115 & 6.82 & $ 2.22 \pm 0.29 \pm 0.07 $ & $\theta$~Cen \\
2~452.5393 & E0-G1 & 1.40 & 29 & 62.229 & 0.10 & $ 2.73 \pm 0.33 \pm 0.07 $ & HR~4050 \\
2~452.5426 & E0-G1 & 1.40 & 142 & 62.227 & 0.90 & $ 2.87 \pm 0.35 \pm 0.08 $ & HR~4050 \\
2~452.5504 & E0-G1 & 1.40 & 253 & 62.209 & 2.84 & $ 2.32 \pm 0.11 \pm 0.06 $ & HR~4050 \\
2~453.5382 & E0-G1 & 1.40 & 30 & 62.228 & 0.49 & $ 2.45 \pm 0.58 \pm 0.07 $ & HR~4050 \\
2~453.5480 & E0-G1 & 1.40 & 224 & 62.207 & 2.93 & $ 2.54 \pm 0.12 \pm 0.08 $ & HR~4050 \\
2~453.5521 & E0-G1 & 1.40 & 113 & 62.190 & 3.93 & $ 2.54 \pm 0.31 \pm 0.08 $ & HR~4050 \\
2~675.8452 & B3-D1 & 1.40 & 139 & 21.815 & 97.97 & $ 12.89 \pm 1.15 \pm 0.04 $ & HR~4050 \\
2~675.8537 & B3-D1 & 1.40 & 221 & 21.540 & 100.74 & $ 13.11 \pm 0.63 \pm 0.04 $ & HR~4050 \\
2~675.8599 & B3-D1 & 1.40 & 111 & 21.331 & 102.80 & $ 12.36 \pm 1.19 \pm 0.04 $ & HR~4050 \\
2~675.9027 & B3-D1 & 1.40 & 237 & 19.763 & 117.77 & $ 12.09 \pm 0.60 \pm 0.03 $ & HR~4050 \\
2~675.9095 & B3-D1 & 1.40 & 108 & 19.501 & 120.31 & $ 12.67 \pm 1.56 \pm 0.03 $ & HR~4050 \\
2~624.7905 & B3-C3 & 1.40 & 466 & 7.932 & 37.64 & $ 26.38 \pm 1.15 \pm 0.01 $ & HR~4050 \\
2~624.7948 & B3-C3 & 1.40 & 373 & 7.940 & 39.05 & $ 24.84 \pm 1.18 \pm 0.01 $ & HR~4050 \\
2~624.7988 & B3-C3 & 1.40 & 390 & 7.947 & 40.37 & $ 24.35 \pm 1.15 \pm 0.01 $ & HR~4050 \\
2~624.8400 & B3-C3 & 1.40 & 144 & 7.986 & 53.48 & $ 25.79 \pm 1.94 \pm 0.01 $ & HR~4050 \\
2~624.8581 & B3-C3 & 1.40 & 356 & 7.978 & 59.09 & $ 25.61 \pm 1.13 \pm 0.01 $ & HR~4050 \\
2~626.7952 & B3-C3 & 1.40 & 333 & 7.950 & 40.99 & $ 22.91 \pm 0.95 \pm 0.01 $ & HR~4050 \\
2~626.8014 & B3-C3 & 1.40 & 337 & 7.959 & 42.97 & $ 23.34 \pm 0.88 \pm 0.01 $ & HR~4050 \\
2~626.8141 & B3-C3 & 1.40 & 349 & 7.974 & 47.06 & $ 23.31 \pm 0.78 \pm 0.01 $ & HR~4050 \\
2~626.8453 & B3-C3 & 1.40 & 468 & 7.983 & 56.82 & $ 25.40 \pm 0.68 \pm 0.01 $ & HR~4050 \\
2~626.8496 & B3-C3 & 1.40 & 421 & 7.981 & 58.15 & $ 26.07 \pm 0.78 \pm 0.01 $ & HR~4050 \\
2~626.8539 & B3-C3 & 1.40 & 381 & 7.977 & 59.49 & $ 25.79 \pm 0.85 \pm 0.01 $ & HR~4050 \\
2~627.8450 & B3-C3 & 1.40 & 235 & 7.982 & 57.58 & $ 24.50 \pm 1.88 \pm 0.01 $ & HR~4050 \\
2~627.8496 & B3-C3 & 1.40 & 283 & 7.978 & 58.99 & $ 25.06 \pm 1.68 \pm 0.01 $ & HR~4050 \\
2~627.8539 & B3-C3 & 1.40 & 313 & 7.974 & 60.32 & $ 25.28 \pm 1.41 \pm 0.01 $ & HR~4050 \\
2~628.8599 & B3-C3 & 1.40 & 277 & 7.960 & 62.97 & $ 24.13 \pm 1.30 \pm 0.01 $ & HR~4050 \\
2~628.8650 & B3-C3 & 1.40 & 147 & 7.950 & 64.53 & $ 26.82 \pm 2.33 \pm 0.01 $ & HR~4050 \\
2~630.8258 & B3-C3 & 1.40 & 139 & 7.986 & 54.17 & $ 24.57 \pm 2.53 \pm 0.01 $ & HR~4050 \\
2~630.8601 & B3-C3 & 1.40 & 372 & 7.949 & 64.71 & $ 23.47 \pm 0.98 \pm 0.01 $ & HR~4050 \\
2~631.8387 & B3-C3 & 1.40 & 205 & 7.978 & 59.00 & $ 24.13 \pm 1.14 \pm 0.01 $ & HR~4050 \\
2~631.8428 & B3-C3 & 1.40 & 90 & 7.974 & 60.25 & $ 24.40 \pm 2.75 \pm 0.01 $ & HR~4050 \\
2~631.8780 & B3-C3 & 1.40 & 151 & 7.888 & 70.97 & $ 24.46 \pm 1.10 \pm 0.01 $ & HR~4050 \\
2~651.8286 & B3-C3 & 1.40 & 435 & 7.867 & 72.53 & $ 27.06 \pm 1.01 \pm 0.01 $ & HR~4050 \\
2~651.8534 & B3-C3 & 1.40 & 195 & 7.740 & 80.02 & $ 25.86 \pm 1.93 \pm 0.01 $ & HR~4050 \\
2~651.8619 & B3-C3 & 1.40 & 421 & 7.684 & 82.62 & $ 25.79 \pm 1.09 \pm 0.01 $ & HR~4050 \\
2~651.8702 & B3-C3 & 1.40 & 332 & 7.625 & 85.15 & $ 24.29 \pm 1.13 \pm 0.01 $ & HR~4050 \\
2~652.8461 & B3-C3 & 1.40 & 185 & 7.767 & 78.64 & $ 28.03 \pm 1.38 \pm 0.01 $ & HR~4050 \\
2~652.8640 & B3-C3 & 1.40 & 142 & 7.650 & 84.11 & $ 26.78 \pm 2.61 \pm 0.01 $ & HR~4050 \\
2~654.7670 & B3-C3 & 1.40 & 88 & 7.984 & 56.25 & $ 24.93 \pm 0.98 \pm 0.01 $ & HR~4050 \\
2~654.7718 & B3-C3 & 1.40 & 272 & 7.982 & 57.73 & $ 23.59 \pm 0.79 \pm 0.01 $ & HR~4050 \\
2~654.7769 & B3-C3 & 1.40 & 120 & 7.977 & 59.31 & $ 28.27 \pm 2.99 \pm 0.01 $ & HR~4050 \\
2~654.8272 & B3-C3 & 1.40 & 71 & 7.837 & 74.59 & $ 26.90 \pm 1.44 \pm 0.01 $ & HR~4050 \\
2~654.8311 & B3-C3 & 1.40 & 335 & 7.818 & 75.77 & $ 24.46 \pm 0.83 \pm 0.01 $ & HR~4050 \\
2~654.8483 & B3-C3 & 1.40 & 435 & 7.720 & 80.99 & $ 26.62 \pm 0.57 \pm 0.01 $ & HR~4050 \\
2~663.7817 & B3-D1 & 1.40 & 212 & 23.795 & 68.34 & $ 15.19 \pm 0.91 \pm 0.05 $ & HR~4050 \\
2~664.8213 & B3-D1 & 1.40 & 66 & 23.197 & 81.14 & $ 12.54 \pm 1.77 \pm 0.04 $ & HR~4050 \\
2~664.8519 & B3-D1 & 1.40 & 187 & 22.493 & 90.57 & $ 14.36 \pm 1.33 \pm 0.05 $ & HR~4050 \\
2~664.8561 & B3-D1 & 1.40 & 187 & 22.379 & 91.88 & $ 14.41 \pm 1.23 \pm 0.05 $ & HR~4050 \\
2~665.8654 & B3-D1 & 1.40 & 227 & 22.032 & 95.70 & $ 12.34 \pm 0.80 \pm 0.04 $ & HR~4050 \\
2~670.6898 & B3-D1 & 1.40 & 320 & 23.946 & 45.81 & $ 13.89 \pm 0.72 \pm 0.05 $ & HR~4050 \\
2~670.7270 & B3-D1 & 1.40 & 263 & 23.985 & 57.49 & $ 16.20 \pm 1.43 \pm 0.06 $ & HR~4050 \\
2~670.7312 & B3-D1 & 1.40 & 287 & 23.976 & 58.77 & $ 14.12 \pm 1.24 \pm 0.05 $ & HR~4050 \\
2~670.7567 & B3-D1 & 1.40 & 217 & 23.845 & 66.57 & $ 16.16 \pm 1.34 \pm 0.06 $ & HR~4050 \\
2~670.7661 & B3-D1 & 1.40 & 177 & 23.762 & 69.40 & $ 15.69 \pm 1.75 \pm 0.05 $ & HR~4050 \\
2~670.8071 & B3-D1 & 1.40 & 172 & 23.154 & 81.81 & $ 13.67 \pm 1.46 \pm 0.04 $ & HR~4050 \\
2~670.8121 & B3-D1 & 1.40 & 158 & 23.051 & 83.35 & $ 14.16 \pm 1.12 \pm 0.05 $ & HR~4050 \\
2~675.8452 & B3-D1 & 1.40 & 139 & 21.815 & 97.97 & $ 12.89 \pm 1.15 \pm 0.04 $ & HR~4050 \\
2~675.8537 & B3-D1 & 1.40 & 221 & 21.540 & 100.74 & $ 13.11 \pm 0.63 \pm 0.04 $ & HR~4050 \\
2~675.8599 & B3-D1 & 1.40 & 111 & 21.331 & 102.80 & $ 12.36 \pm 1.19 \pm 0.04 $ & HR~4050 \\
2~675.9027 & B3-D1 & 1.40 & 237 & 19.763 & 117.77 & $ 12.09 \pm 0.60 \pm 0.03 $ & HR~4050 \\
2~675.9095 & B3-D1 & 1.40 & 108 & 19.501 & 120.31 & $ 12.67 \pm 1.56 \pm 0.03 $ & HR~4050 \\
2~677.7022 & B3-D1 & 1.40 & 458 & 23.993 & 55.70 & $ 14.67 \pm 0.45 \pm 0.05 $ & HR~4050 \\
2~677.7094 & B3-D1 & 1.40 & 466 & 23.982 & 57.94 & $ 14.56 \pm 0.42 \pm 0.05 $ & HR~4050 \\
2~677.7168 & B3-D1 & 1.40 & 463 & 23.961 & 60.21 & $ 13.88 \pm 0.41 \pm 0.05 $ & HR~4050 \\
2~677.7542 & B3-D1 & 1.40 & 389 & 23.684 & 71.59 & $ 12.47 \pm 0.40 \pm 0.04 $ & HR~4050 \\
2~677.7617 & B3-D1 & 1.40 & 357 & 23.590 & 73.85 & $ 12.07 \pm 0.43 \pm 0.04 $ & HR~4050 \\
2~677.7698 & B3-D1 & 1.40 & 377 & 23.473 & 76.31 & $ 12.32 \pm 0.41 \pm 0.04 $ & HR~4050 \\
2~678.8376 & B3-D1 & 1.40 & 485 & 21.795 & 98.17 & $ 13.91 \pm 0.32 \pm 0.04 $ & HR~4050 \\
2~678.8447 & B3-D1 & 1.40 & 450 & 21.565 & 100.49 & $ 13.19 \pm 0.32 \pm 0.04 $ & HR~4050 \\
2~678.8519 & B3-D1 & 1.40 & 386 & 21.326 & 102.85 & $ 12.32 \pm 0.35 \pm 0.04 $ & HR~4050 \\
2~678.8914 & B3-D1 & 1.40 & 389 & 19.881 & 116.62 & $ 14.84 \pm 0.40 \pm 0.04 $ & HR~4050 \\
2~678.8979 & B3-D1 & 1.40 & 208 & 19.634 & 119.02 & $ 15.38 \pm 0.60 \pm 0.04 $ & HR~4050 \\
2~679.8071 & B3-D1 & 1.40 & 387 & 22.594 & 89.36 & $ 13.53 \pm 0.32 \pm 0.04 $ & HR~4050 \\
2~679.8149 & B3-D1 & 1.40 & 256 & 22.386 & 91.81 & $ 12.34 \pm 0.38 \pm 0.04 $ & HR~4050 \\
2~679.8216 & B3-D1 & 1.40 & 285 & 22.197 & 93.92 & $ 12.87 \pm 0.52 \pm 0.04 $ & HR~4050 \\
2~679.8580 & B3-D1 & 1.40 & 355 & 21.018 & 105.82 & $ 13.10 \pm 0.39 \pm 0.04 $ & HR~4050 \\
2~679.8644 & B3-D1 & 1.40 & 113 & 20.789 & 108.00 & $ 13.88 \pm 2.00 \pm 0.04 $ & HR~4050 \\
2~679.8941 & B3-D1 & 1.40 & 193 & 19.674 & 118.63 & $ 15.15 \pm 0.90 \pm 0.04 $ & HR~4050 \\
2~683.7023 & B3-D1 & 1.40 & 206 & 23.954 & 60.78 & $ 11.48 \pm 0.86 \pm 0.03 $ & HR~4050 \\
2~683.7105 & B3-D1 & 1.40 & 128 & 23.916 & 63.31 & $ 13.09 \pm 1.79 \pm 0.03 $ & HR~4050 \\
2~683.7171 & B3-D1 & 1.40 & 169 & 23.875 & 65.31 & $ 12.65 \pm 1.20 \pm 0.03 $ & HR~4050 \\
2~683.7274 & B3-D1 & 1.40 & 430 & 23.792 & 68.45 & $ 12.83 \pm 0.46 \pm 0.03 $ & HR~4050 \\
2~683.7347 & B3-D1 & 1.40 & 408 & 23.719 & 70.63 & $ 12.55 \pm 0.49 \pm 0.03 $ & HR~4050 \\
2~683.7421 & B3-D1 & 1.40 & 437 & 23.631 & 72.89 & $ 13.48 \pm 0.48 \pm 0.03 $ & HR~4050 \\
2~683.7746 & B3-D1 & 1.40 & 431 & 23.094 & 82.72 & $ 12.31 \pm 0.43 \pm 0.03 $ & HR~4050 \\
2~683.7819 & B3-D1 & 1.40 & 467 & 22.936 & 84.96 & $ 13.01 \pm 0.44 \pm 0.03 $ & HR~4050 \\
2~683.7888 & B3-D1 & 1.40 & 444 & 22.775 & 87.10 & $ 12.72 \pm 0.45 \pm 0.03 $ & HR~4050 \\
2~683.8185 & B3-D1 & 1.40 & 243 & 21.963 & 96.43 & $ 12.14 \pm 0.50 \pm 0.03 $ & HR~4050 \\
2~683.8254 & B3-D1 & 1.40 & 105 & 21.749 & 98.64 & $ 13.00 \pm 1.64 \pm 0.03 $ & HR~4050 \\
2~683.8581 & B3-D1 & 1.40 & 192 & 20.621 & 109.59 & $ 12.09 \pm 0.64 \pm 0.03 $ & HR~4050 \\
2~683.8658 & B3-D1 & 1.40 & 449 & 20.334 & 112.31 & $ 13.39 \pm 0.46 \pm 0.03 $ & HR~4050 \\
2~683.8736 & B3-D1 & 1.40 & 256 & 20.040 & 115.10 & $ 12.48 \pm 0.93 \pm 0.03 $ & HR~4050 \\
2~683.8928 & B3-D1 & 1.40 & 172 & 19.306 & 122.25 & $ 14.13 \pm 1.31 \pm 0.04 $ & HR~4050 \\
2~683.9008 & B3-D1 & 1.40 & 272 & 18.998 & 125.39 & $ 13.21 \pm 0.83 \pm 0.03 $ & HR~4050 \\
2~683.9065 & B3-D1 & 1.40 & 275 & 18.784 & 127.63 & $ 13.83 \pm 0.75 \pm 0.04 $ & HR~4050 \\
2~684.7819 & B3-D1 & 1.40 & 211 & 22.874 & 85.81 & $ 13.05 \pm 0.59 \pm 0.01 $ & HR~4050 \\
2~684.7929 & B3-D1 & 1.40 & 80 & 22.607 & 89.21 & $ 11.33 \pm 1.71 \pm 0.01 $ & HR~4050 \\
2~684.7992 & B3-D1 & 1.40 & 118 & 22.442 & 91.16 & $ 12.58 \pm 1.44 \pm 0.01 $ & HR~4050 \\
2~684.8310 & B3-D1 & 1.40 & 198 & 21.476 & 101.38 & $ 12.17 \pm 0.49 \pm 0.01 $ & HR~4050 \\
2~741.7918 & B3-M0 & 1.40 & 55 & 84.580 & 131.47 & $ 1.12 \pm 0.37 \pm 0.04 $ & HR~4526 \\
2~742.7684 & B3-M0 & 1.40 & 70 & 90.319 & 122.20 & $ 0.80 \pm 0.23 \pm 0.03 $ & HR~4526 \\
2~742.7849 & B3-M0 & 1.40 & 52 & 85.714 & 129.50 & $ 2.52 \pm 1.12 \pm 0.09 $ & HR~4526 \\
2~745.6829 & B3-M0 & 1.40 & 36 & 112.435 & 93.90 & $ 0.68 \pm 0.71 \pm 0.01 $ & HR~4831%. HR~4546
\\
2~769.6173 & B3-M0 & 1.40 & 104 & 112.447 & 93.89 & $ 0.81 \pm 0.12 \pm 0.01 $ & HR~4831 \\
2~769.6249 & B3-M0 & 1.40 & 94 & 110.408 & 96.36 & $ 0.65 \pm 0.13 \pm 0.01 $ & HR~4831 \\
2~769.6299 & B3-M0 & 1.40 & 111 & 109.049 & 98.01 & $ 0.82 \pm 0.12 \pm 0.01 $ & HR~4831 \\
2~770.6169 & B3-M0 & 1.40 & 82 & 111.816 & 94.66 & $ 0.85 \pm 0.21 \pm 0.01 $ & HR~4831 \\
2~770.6224 & B3-M0 & 1.40 & 64 & 110.358 & 96.42 & $ 0.94 \pm 0.33 \pm 0.01 $ & HR~4831 \\
2~770.6280 & B3-M0 & 1.40 & 81 & 108.811 & 98.29 & $ 0.63 \pm 0.19 \pm 0.01 $ & HR~4831 \\
2~786.6480 & B3-M0 & 1.40 & 226 & 90.383 & 122.10 & $ 1.47 \pm 0.08 \pm 0.05 $ & HR~4546 \\
2~786.6581 & B3-M0 & 1.40 & 184 & 87.543 & 126.48 & $ 1.50 \pm 0.10 \pm 0.05 $ & HR~4546 \\
2~786.6634 & B3-M0 & 1.40 & 133 & 86.084 & 128.87 & $ 1.49 \pm 0.13 \pm 0.05 $ & HR~4546 \\
2~790.5635 & E0-G0 & 1.40 & 480 & 13.813 & 108.79 & $ 25.20 \pm 0.39 \pm 0.01 $ & HR~4546 \\
2~790.5686 & E0-G0 & 1.40 & 369 & 13.688 & 110.56 & $ 21.89 \pm 0.40 \pm 0.01 $ & HR~4546 \\
2~790.5733 & E0-G0 & 1.40 & 346 & 13.571 & 112.23 & $ 23.13 \pm 0.47 \pm 0.01 $ & HR~4546 \\
2~790.6054 & E0-G0 & 1.40 & 426 & 12.755 & 124.14 & $ 26.06 \pm 0.59 \pm 0.01 $ & HR~4546 \\
2~790.6103 & E0-G0 & 1.40 & 479 & 12.633 & 126.03 & $ 28.03 \pm 0.58 \pm 0.01 $ & HR~4546 \\
2~790.6151 & E0-G0 & 1.40 & 406 & 12.512 & 127.94 & $ 24.87 \pm 0.56 \pm 0.01 $ & HR~4546 \\
2~791.4925 & E0-G0 & 1.40 & 468 & 15.214 & 86.68 & $ 25.02 \pm 0.30 \pm 0.01 $ & HR~4546 \\
2~791.4974 & E0-G0 & 1.40 & 358 & 15.135 & 88.20 & $ 22.31 \pm 0.36 \pm 0.01 $ & HR~4546 \\
2~791.5023 & E0-G0 & 1.40 & 180 & 15.053 & 89.70 & $ 22.05 \pm 0.85 \pm 0.01 $ & HR~4546 \\
2~791.5296 & E0-G0 & 1.40 & 419 & 14.526 & 98.37 & $ 23.30 \pm 0.35 \pm 0.01 $ & HR~4546 \\
2~791.5347 & E0-G0 & 1.40 & 297 & 14.416 & 100.03 & $ 21.75 \pm 0.45 \pm 0.01 $ & HR~4546 \\
2~791.5398 & E0-G0 & 1.40 & 154 & 14.305 & 101.69 & $ 20.42 \pm 0.96 \pm 0.01 $ & HR~4546 \\
2~791.5737 & E0-G0 & 1.40 & 445 & 13.494 & 113.32 & $ 25.73 \pm 0.59 \pm 0.01 $ & HR~4546 \\
2~791.5786 & E0-G0 & 1.40 & 381 & 13.371 & 115.08 & $ 24.49 \pm 0.59 \pm 0.01 $ & HR~4546 \\
2~791.5840 & E0-G0 & 1.40 & 329 & 13.233 & 117.06 & $ 20.99 \pm 0.58 \pm 0.01 $ & HR~4546 \\
2~791.6264 & E0-G0 & 1.40 & 453 & 12.166 & 133.73 & $ 25.88 \pm 0.58 \pm 0.01 $ & HR~4546 \\
2~791.6316 & E0-G0 & 1.40 & 375 & 12.044 & 135.90 & $ 25.05 \pm 0.61 \pm 0.01 $ & HR~4546 \\
2~791.6367 & E0-G0 & 1.40 & 358 & 11.927 & 138.09 & $ 23.81 \pm 0.58 \pm 0.01 $ & HR~4546 \\
2~977.8452 & E0-G0 & 1.40 & 390 & 15.962 & 44.66 & $ 24.45 \pm 0.41 \pm 0.01 $ & HR~4546 \\
2~977.8530 & E0-G0 & 1.40 & 333 & 15.980 & 47.14 & $ 24.03 \pm 0.41 \pm 0.01 $ & HR~4546 \\
3~011.7317 & D0-H0 & 1.40 & 111 & 63.563 & 37.94 & $ 4.72 \pm 0.37 \pm 0.07 $ & HR~4050 \\
\end{tabular}
\end{table}