\begin{table}%t5
\caption{Uncertainties in Fe abundances for stars observed with Giraffe.}\label{t:errorparam}
%\centering
\small
\begin{tabular}{lrrrrrrrr}
\hline \hline
Element   &Average &$T_{\rm eff}$&$\log{g}$& $[$A/H$]$ & $v_{\rm t}$   &  {\it EW}s  &Total   &Total     \\
           &No. lines&         &         &         &         &       &Internal&Systematic\\
\hline
Variation  &        &    100  &  +0.30  &  +0.20  &  +0.20  &       &       &       \\
Internal   &        &     17  &   0.02  &   0.00  &   0.15  & 0.200 &       &       \\
Systematic &        &     67  &   0.11  &   0.04  &   0.04  &       &       &       \\
\hline
$[$Fe/H$]$I  & 32.0   &   0.005 &   0.070 &   0.057 &$-$0.112 & 0.035 & 0.080 & 0.037 \\
$[$Fe/H$]$II &  1.7   &$-$0.195 &   0.198 &   0.091 &$-$0.041 & 0.152 & 0.164 & 0.176 \\
$[$O/Fe$]$   &  1.8   &   0.027 &   0.052 &   0.021 &   0.103 & 0.149 & 0.172 & 0.075 \\
$[$Na/Fe$]$  &  2.0   &   0.092 &$-$0.073 &$-$0.060 &   0.040 & 0.141 & 0.150 & 0.095 \\
$[$Mg/Fe$]$  &  2.5   &$-$0.035 &$-$0.014 &$-$0.028 &   0.077 & 0.126 & 0.144 & 0.065 \\
$[$Si/Fe$]$  &  4.9   &$-$0.120 &   0.018 &$-$0.010 &   0.089 & 0.090 & 0.120 & 0.093 \\
$[$Ca/Fe$]$  &  3.9   &   0.116 &$-$0.108 &$-$0.037 &$-$0.018 & 0.101 & 0.110 & 0.100 \\
$[$Sc/Fe$]$  &  3.8   &$-$0.031 &   0.055 &   0.014 &   0.048 & 0.103 & 0.115 & 0.057 \\
$[$Ti/Fe$]$  &  1.0   &   0.170 &$-$0.058 &$-$0.020 &$-$0.088 & 0.200 & 0.216 & 0.148 \\
$[$V/Fe$]$   & 10.3   &   0.195 &$-$0.070 &$-$0.007 &$-$0.100 & 0.062 & 0.109 & 0.138 \\
$[$Cr/Fe$]$  &  2.9   &   0.145 &$-$0.045 &$-$0.020 &$-$0.076 & 0.117 & 0.138 & 0.113 \\
$[$Ni/Fe$]$  & 13.2   &$-$0.043 &   0.025 &$-$0.002 &   0.040 & 0.055 & 0.072 & 0.043 \\
$[$Ba/Fe$]$  &  1.0   &   0.014 &   0.005 &   0.037 &$-$0.057 & 0.200 & 0.208 & 0.092 \\
\hline
\end{tabular}
\end{table}