\begin{table}%T3
\caption{\label{crtable}Out-FOV and in-FOV count rates for the refilled
background event files between 2.5~keV and 6.0~keV.  The pattern code 
gives the patterns used, and can be
either equal to 0, $\leq$12 (MOS) or $\leq$4 (PN). For the
mode/filter combination a code is used, and for some PN files the
location dependent of the file is indicated where appropriate [f --
full-frame mode, e -- full-frame-extended mode, t -- thin filter, m --
medium filter, k -- thick, AC -- galactic anti-centre hemisphere, GC --
galactic hemisphere].}  
\small%\centering
\par
\begin{tabular}{lcccc}
\hline
\hline
Instr & Mode/Filt./location & Pattern & Out-FOV count rate (2.5$-$6~keV)                 & In-FOV count rate (2.5$-$6~keV)  \\ 
      & if applicable       & code    & (ct/s/arcmin$^2$)$\times$10$^{-4}$ & (ct/s/arcmin$^2$)$\times$10$^{-4}$          \\
\hline
M1    & ft                  & 0       & 2.69 & 5.74\\
M1    & ft                  & 12      & 4.01 & 8.17\\
M1    & fm                  & 0       & 2.80 & 6.92\\
M1    & fm                  & 12      & 4.15 & 9.80\\
M1    & fk                  & 0       & 2.68 & 3.52\\
M1    & fk                  & 12      & 4.02 & 5.11\\
\hline
M2    & ft                  & 0       & 2.87 & 5.92\\
M2    & ft                  & 12      & 4.21 & 8.92\\
M2    & fm                  & 0       & 2.93 & 6.70\\
M2    & fm                  & 12      & 4.29 & 9.34\\
M2    & fk                  & 0       & 2.88 & 3.48\\
M2    & fk                  & 12      & 4.22 & 4.96\\
\hline
PN    & et                  & 0       & 20.4 & 37.2\\
PN    & et                  & 4       & 31.2 & 58.4\\
PN    & em                  & 0       & 31.3 & 62.2\\
PN    & em                  & 4       & 48.1 & 98.0\\
PN    & ek                  & 0       & 11.8 & 17.3\\
PN    & ek                  & 4       & 17.7 & 26.8\\
\hline
PN    & ft  AC              & 0       & 25.4 & 47.7\\
PN    & ft  AC              & 4       & 39.1 & 74.9\\
PN    & ft  GC              & 0       & 34.2 & 64.1\\
PN    & ft  GC              & 4       & 52.6 & 101.0\\
PN    & fm  AC              & 0       & 27.7 & 45.3\\
PN    & fm  AC              & 4       & 42.6 & 71.1\\
PN    & fm  GC              & 0       & 39.5 & 80.1\\
PN    & fm  GC              & 4       & 61.0 & 126.5\\
PN    & fk                  & 0       & 19.0 & 31.3\\
PN    & fk                  & 4       & 28.9 & 49.0\\
\hline
\end{tabular}
\end{table}