\begin{table}%t1
\caption{Parameters of the 3D simulations.}\label{tbl-1}
%\centerline
{\small\begin{tabular}{crrrrrr}
\noalign{\smallskip}\hline\hline \noalign{\smallskip}
Name & $L_{\rm box^ {\it a}}$&$\Delta {x^b}$&$R_{b^c}$ &$d_{b^d}$ & $E_{\rm int}$ &
$t_{\rm final}$ \\
\hline
CO & 4800 & 4688 & --  & -- & -- & 500 \\
CO2 & 600 & 586 & --  & -- & -- & 250 \\
SB1011 & 600 & 586 & 10 & 11 & 337 & 250\\
SB1020 & 600 & 586 & 10 & 20 & 281 & 250\\
SB1030 & 600 & 586 & 10 & 30 & 235 & 250\\
\hline
\end{tabular}}
\smallskip
$^a$~The box size in kpc. $^b$~The maximum resolution in pc. $^c$~The radius of the bubbles in kpc.
$^d$~The distance of the center of the bubbles from the center of the cluster in kpc. $^e$~The internal energy of the bubbles in units of $10^{57}$~erg. $^f$~The time of the final output of the simulation in~Myr.
\end{table}