\begin{table}%TA.1
%\centering
\small
\caption{Mean HJDs, phases and image subdivisions of our
spectra. Phases are from Eq.~(\ref{eq1}). NSO96 refers to the NSO
McMath data from 1996/97 and the number 1--4 to the individual
images. KPNO98 refers to the KPNO coud\'e feed data from 1997/98.}
\label{TA1}
 \begin{tabular}{rrl}
  \hline\hline
  %\noalign{\smallskip}
 HJD &  phase & image\\
  %\noalign{\smallskip}
  \hline
  %\noalign{\smallskip}
2450390.9194    &0.1558  &NSO96/1\\
2450391.8258    &0.2068  &NSO96/1\\
2450392.7942    &0.2613  &NSO96/1\\
2450393.7924    &0.3175  &NSO96/1\\
2450394.8117    &0.3749  &NSO96/1\\
2450395.8134    &0.4312  &NSO96/1\\
2450396.8579    &0.4900  &NSO96/1\\
2450398.7825    &0.5983  &NSO96/1\\
2450399.7410    &0.6523  &NSO96/1\\
2450400.6840    &0.7053  &NSO96/1\\
2450401.6709    &0.7609  &NSO96/1\\
2450404.6840    &0.9304  &NSO96/1\\
2450405.7678    &0.9914  &NSO96/1\\
2450406.7367    &0.0460  &NSO96/1\\
2450408.6766    &0.1551  &NSO96/2\\
2450409.6695    &0.2110  &NSO96/2\\
2450411.7056    &0.3256  &NSO96/2\\
2450412.7057    &0.3819  &NSO96/2\\
2450413.7173    &0.4388  &NSO96/2\\
2450414.7202    &0.4952  &NSO96/2\\
2450415.7555    &0.5535  &NSO96/2\\
2450416.7230    &0.6079  &NSO96/2\\
2450417.8130    &0.6693  &NSO96/2\\
2450418.7124    &0.7199  &NSO96/2\\
2450419.6352    &0.7718  &NSO96/2\\
2450420.6493    &0.8289  &NSO96/2\\
2450421.6085    &0.8829  &NSO96/2\\
2450422.6607    &0.9421  &NSO96/2\\
2450423.6663    &0.9987  &NSO96/2\\
2450424.6851    &0.0560  &NSO96/2\\
2450425.6626    &0.1110  &NSO96/2\\
2450426.6742    &0.1680  &NSO96/3\\
2450427.7568    &0.2289  &NSO96/3\\
2450429.6492    &0.3354  &NSO96/3\\
2450430.6693    &0.3928  &NSO96/3\\
2450431.6403    &0.4474  &NSO96/3\\
2450432.6946    &0.5068  &NSO96/3\\
2450433.6758    &0.5620  &NSO96/3\\
2450434.6589    &0.6173  &NSO96/3\\
2450435.6782    &0.6747  &NSO96/3\\
2450436.6931    &0.7318  &NSO96/3\\
2450437.5948    &0.7825  &NSO96/3\\
2450438.6706    &0.8431  &NSO96/3\\
2450439.7083    &0.9015  &NSO96/3, NSO96/4\\
2450440.6931    &0.9569  &NSO96/3, NSO96/4\\
2450441.6795    &0.0124  &NSO96/3, NSO96/4\\
2450445.6454    &0.2356  &NSO96/4\\
2450446.6315    &0.2911  &NSO96/4\\
2450447.6136    &0.3464  &NSO96/4\\
2450448.7135    &0.4083  &NSO96/4\\
2450450.5984    &0.5143  &NSO96/4\\
2450451.5888    &0.5701  &NSO96/4\\
2450453.7428    &0.6913  &NSO96/4\\
2450457.6412    &0.9107  &NSO96/4\\
 \hline
2450809.6889    &0.7227   &KPNO98\\
2450810.6465    &0.7766   &KPNO98\\
2450811.6758    &0.8345   &KPNO98\\
2450813.6427    &0.9452   &KPNO98\\
2450814.6903    &0.2583   &KPNO98\\
2450815.7055    &0.0613   &KPNO98\\
2450816.6361    &0.1136   &KPNO98\\
2450819.8002    &0.2917   &KPNO98\\
2450821.6960    &0.3984   &KPNO98\\
2450822.7408    &0.4572   &KPNO98\\
2450825.6868    &0.6230   &KPNO98\\
2450826.6835    &0.6791   &KPNO98\\
2450827.7257    &0.7377   &KPNO98\\
2450828.7232    &0.7938   &KPNO98\\
 \hline
 \end{tabular}
\end{table}