\begin{table}%t3
%\begin{center}
\par
\caption{\label{t-par} Assumed binary parameter of WX~Ceti and model
parameter. In the EMT scenario $f_{\rm ill}$ defines
the strength of enhanced mass transfer and $\langle\Rout\rangle$ the mean
outer radius which is assumed to be given by the average of $r_1,
r_2$, and $r_{\rm max}$ in Table~1 of \citet{Paczynsky1977}. 
We arbitrarily assumed a rather low value of the viscosity parameter during
quiescence ($\alpha_c$) to reproduce the long lasting low-states. 
%This
%assumptions, however, is obviously arbitrary and very probably not  
}
\begin{tabular}{lc}
%
\hline\hline\noalign{\smallskip}
%
\Porb/h        & 1.4\\
\Tsec       & 2750~K  \\
$\Mwd/\Msun$ & 1.0  \\
$\Msec/\Msun$ & 0.1 \\
\Rwd/$10^8$~cm & 5.6  \\
$i$/$~^{\circ}$ & $60$\\
d/pc & $100$  \\
$\alpha_{\rm c}$ & 0.008  \\
$\alpha_{\rm h}$ & 0.12  \\
$\langle R_{{\rm out}}\rangle/10^{10}$cm & 2.1  \\
$f_{\rm ill}$ & 0.15  \\
%-----------------------------------------------------------------
\hline
\end{tabular}
\par
%\end{center}
\par
\end{table}