\begin{table}%t1
\caption{Journal of the PMT observations of 44~Tau from 2000 to 2003. Data were gathered with the 0.75-m APT (Vienna Automatic Photoelectric Telescope) and with the 0.90~m telescope at the OSN (Observatorio die Sierra Nevada).}
\label{table1}
%\centering
\small
\begin{tabular}{lll|lll|lll}
\hline\hline
Start & Length & Obs./& Start & Length & Obs./&Start & Length & Obs./\\
HJD & hours & Telescope & HJD & hours& Telescope & HJD & hours & Telescope \\
2~450~000+ & &  & 2~450~000+& &  & 2~450~000+ & &\\
\hline
\multicolumn{3}{l}{\hspace{12mm}Year 2000/2001} & 1900.59 & 6.1 & APT75 & 2267.60 & 6.6 & APT75\\
1842.72 & 5.2 & APT75 & 1903.71 & 2.8 & APT75 & 2268.58 & 6.8 & APT75\\
1846.89 & 2.4 & APT75 & 1904.58 & 7.2 & APT75 & 2269.60 & 6.3 & APT75\\
1855.52 & 5.1 & OSN90 & 1905.58 & 5.1 & APT75 & 2270.59 & 3.4 & APT75\\
1856.37 & 8.8 & OSN90 & 1906.58 & 7.3 & APT75 & 2275.58 & 0.9 & APT75\\
1857.69 & 6.3 & APT75 & 1907.58 & 7.1 & APT75 & 2276.69 & 1.4 & APT75\\
1858.38 & 7.8 & OSN90 & 1908.58 & 5.7 & APT75 & 2279.59 & 3.9 & APT75\\
1858.68 & 5.6 & APT75 & 1909.76 & 2.7 & APT75 & 2283.63 & 2.0 & APT75\\
1860.40 & 8.1 & OSN90 & 1914.58 & 2.8 & APT75 & 2286.61 & 3.7 & APT75\\
1864.34 & 9.4 & OSN90 & 1920.62 & 3.0 & APT75 & 2293.60 & 1.1 & APT75\\
1866.41 & 7.8 & OSN90 & 1921.59 & 6.1 & APT75 & 2296.68 & 2.8 & APT75\\
1866.71 & 4.0 & APT75 & 1923.61 & 4.6 & APT75 & 2299.64 & 3.6 & APT75\\
1867.31 &10.1 & OSN90 & \multicolumn{3}{c}{Year 2001/2002}& 2300.66 & 2.4 & APT75\\
1867.66 & 7.9 & APT75 & 2221.74 & 5.7 & APT75 & \multicolumn{3}{c}{Year 2002/2003}\\
1868.30 &10.2 & OSN90 & 2224.68 & 7.5 & APT75 & 2641.72 & 2.9 & APT75\\
1868.65 & 6.0 & APT75 & 2225.68 & 7.6 & APT75 & 2642.62 & 5.5 & APT75\\
1871.65 & 7.7 & APT75 & 2228.67 & 6.3 & APT75 & 2643.64 & 4.6 & APT75\\
1872.64 & 8.0 & APT75 & 2229.67 & 7.7 & APT75 & 2644.62 & 5.5 & APT75\\
1873.64 & 7.3 & APT75 & 2230.66 & 7.2 & APT75 & 2645.73 & 2.6 & APT75\\
1874.64 & 7.9 & APT75 & 2233.86 & 2.7 & APT75 & 2649.62 & 5.2 & APT75\\
1875.64 & 7.7 & APT75 & 2240.65 & 3.8 & APT75 & 2650.62 & 5.4 & APT75\\
1877.63 & 7.9 & APT75 & 2245.63 & 4.9 & APT75 & 2651.61 & 5.1 & APT75\\
1878.63 & 5.8 & APT75 & 2246.62 & 5.0 & APT75 & 2664.63 & 2.9 & APT75\\
1882.62 & 8.0 & APT75 & 2247.63 & 5.7 & APT75 & 2665.63 & 3.5 & APT75\\
1890.77 & 2.4 & APT75 & 2251.62 & 5.9 & APT75 & 2666.62 & 3.6 & APT75\\
1893.59 & 7.8 & APT75 & 2257.63 & 5.1 & APT75 & 2667.62 & 4.2 & APT75\\
1894.62 & 7.0 & APT75 & 2261.69 & 4.5 & APT75 & 2668.60 & 3.9 & APT75\\
1895.58 & 8.0 & APT75 & 2262.59 & 5.7 & APT75 & 2670.60 & 4.2 & APT75\\
1896.68 & 0.9 & APT75 & 2263.61 & 2.2 & APT75 & 2671.60 & 4.2 & APT75\\
1897.58 & 7.7 & APT75 & 2265.59 & 7.2 & APT75 & 2673.60 & 3.7 & APT75\\
1898.61 & 7.1 & APT75 & 2266.59 & 3.1 & APT75 & 2677.61 & 2.2 & APT75\\
\hline
\end{tabular}
\end{table}