\begin{table}%t4
\caption{The list of rich 2dF Southern superclusters.}\label{tab:Sscl}
%\centering
\small
\begin{tabular}{rrrrrrrrrrrrrcc}
\hline
\hline
Id & RA & Dec & $d$ & $D_{\rm min}$ & $D_{\rm max}$ & $D_{\rm e}$ &$\epsilon_0$& $\Delta_{\rm o}$ & $\delta_{\rm p}$& $\delta_{\rm m}$&
$N_{\rm gal}$& $N_{\rm cl}$ &  $L_{\rm m}$  & $L_{\rm tot}$ \\
   & deg& deg & Mpc & Mpc & Mpc   & Mpc &   & Mpc  & & & & & & \\
\hline
   5 &   1.85 & --28.06 & 177.4 &  20.0 &  45.7 &  19.7 &   1.3 &   6.8 &  10.3 &   6.2 &   952 &     5 &  0.4755E+11 &  0.4824E+13 \\  
  10 &   3.02 & --27.42 & 362.6 &  39.0 &  96.3 &  25.4 &   2.2 &  15.5 &   9.4 &   5.9 &   535 &    17 &  0.4525E+11 &  0.1155E+14 \\  
  11 &   3.49 & --27.10 & 436.8 &  17.0 &  38.8 &  17.3 &   1.3 &   6.7 &  11.6 &   6.4 &   101 &     3 &  0.4848E+11 &  0.3902E+13 \\  
  18 &   5.15 & --33.91 & 459.5 &  16.0 &  40.5 &  16.5 &   1.4 &   8.5 &  10.1 &   6.1 &    75 &     3 &  0.2783E+11 &  0.3581E+13 \\  
  19 &   5.17 & --25.73 & 414.7 &  18.0 &  33.0 &  17.2 &   1.1 &   2.9 &  11.8 &   6.8 &    91 &     2 &  0.1359E+12 &  0.3566E+13 \\  
  34 &   9.86 & --28.94 & 326.3 &  60.0 & 140.1 &  40.9 &   2.0 &  21.6 &  25.8 &   8.1 &  3175 &    24 &  0.4528E+11 &  0.4975E+14 \\  
  51 &  13.98 & --30.08 & 455.4 &  33.0 &  77.2 &  25.6 &   1.7 &  13.6 &  17.3 &   7.6 &   272 &     7 &  0.4022E+11 &  0.1278E+14 \\  
  60 &  16.54 & --26.29 & 376.5 &  17.0 &  41.1 &  15.7 &   1.5 &   9.5 &   8.2 &   5.7 &   132 &     4 &  0.2102E+11 &  0.2905E+13 \\  
  64 &  17.74 & --33.10 & 475.4 &  12.0 &  34.1 &  15.6 &   1.3 &   6.9 &  10.1 &   6.2 &    50 &     4 &  0.9654E+11 &  0.2950E+13 \\  
  78 &  21.00 & --33.35 & 513.6 &  34.0 &  93.1 &  29.7 &   1.8 &  19.2 &  17.9 &   6.8 &   254 &    20 &  0.3307E+11 &  0.1697E+14 \\  
  84 &  21.97 & --34.16 & 383.9 &  21.0 &  50.6 &  20.0 &   1.5 &  10.6 &  17.2 &   7.5 &   225 &     3 &  0.4226E+11 &  0.5491E+13 \\  
  87 &  23.48 & --27.53 & 362.0 &  17.0 &  49.2 &  17.8 &   1.6 &  15.7 &   9.8 &   6.2 &   166 &     4 &  0.4329E+11 &  0.3867E+13 \\  
  88 &  23.57 & --26.11 & 460.3 &  24.0 &  50.7 &  20.0 &   1.5 &   8.4 &  14.1 &   6.9 &   105 &     2 &  0.1200E+12 &  0.5457E+13 \\  
  94 &  25.44 & --30.60 & 483.7 &  38.0 &  75.3 &  27.0 &   1.6 &   4.6 &  10.7 &   6.6 &   245 &    15 &  0.6197E+11 &  0.1316E+14 \\  
  97 &  27.22 & --31.42 & 432.5 &  27.0 &  53.7 &  21.5 &   1.4 &   7.2 &  10.3 &   6.5 &   194 &     5 &  0.2499E+11 &  0.7256E+13 \\  
 109 &  30.94 & --26.79 & 329.1 &  15.0 &  39.0 &  17.9 &   1.3 &   1.9 &  14.3 &   7.1 &   249 &     2 &  0.2811E+11 &  0.4286E+13 \\  
 112 &  31.38 & --34.62 & 475.3 &  27.0 &  60.9 &  22.7 &   1.5 &  12.4 &  13.1 &   6.8 &   148 &     7 &  0.3140E+11 &  0.8057E+13 \\  
 115 &  32.38 & --28.85 & 391.6 &  28.0 &  59.6 &  21.0 &   1.6 &  14.4 &   9.7 &   5.8 &   265 &    10 &  0.1617E+11 &  0.6458E+13 \\  
 116 &  32.60 & --33.01 & 357.3 &  17.0 &  47.8 &  19.1 &   1.4 &  11.1 &  10.8 &   6.3 &   230 &     3 &  0.4483E+11 &  0.4801E+13 \\  
 126 &  34.36 & --29.43 & 314.6 &  17.0 &  40.8 &  17.7 &   1.3 &  12.7 &  10.6 &   6.3 &   291 &     3 &  0.4460E+11 &  0.3683E+13 \\  
 130 &  35.03 & --28.77 & 484.5 &  27.0 &  86.0 &  30.1 &   1.6 &  13.1 &  17.0 &   7.0 &   292 &    19 &  0.3013E+11 &  0.1884E+14 \\  
 148 &  41.09 & --26.27 & 386.3 &  31.0 &  63.5 &  23.3 &   1.6 &   5.2 &  16.4 &   6.9 &   328 &    11 &  0.2811E+11 &  0.8765E+13 \\  
 149 &  41.41 & --34.25 & 506.2 &  16.0 &  34.0 &  16.6 &   1.2 &   5.5 &  11.8 &   6.7 &    67 &     3 &  0.2502E+11 &  0.3516E+13 \\  
 152 &  42.21 & --26.00 & 306.0 &  16.0 &  38.2 &  15.6 &   1.4 &   7.4 &   7.6 &   5.5 &   180 &     4 &  0.2678E+11 &  0.2741E+13 \\  
 153 &  42.57 & --26.42 & 461.3 &  24.0 &  44.5 &  16.8 &   1.5 &  12.2 &   9.2 &   5.8 &    64 &     8 &  0.4152E+11 &  0.3518E+13 \\  
 161 &  46.01 & --31.64 & 510.5 &  22.0 &  42.9 &  17.8 &   1.4 &  11.7 &  11.5 &   6.3 &    50 &     3 &  0.3963E+11 &  0.4215E+13 \\  
 167 &  47.93 & --26.94 & 198.7 &  24.0 &  43.9 &  19.9 &   1.3 &   6.2 &  14.7 &   7.2 &   771 &     2 &  0.4938E+11 &  0.5266E+13 \\  
 179 &  52.32 & --30.10 & 508.4 &  14.0 &  49.5 &  17.7 &   1.6 &   5.3 &   7.8 &   5.7 &    58 &     8 &  0.2036E+11 &  0.4405E+13 \\  
 180 &  52.33 & --26.53 & 421.1 &  44.0 &  90.6 &  25.0 &   2.1 &  25.0 &  10.6 &   6.2 &   263 &    10 &  0.4963E+11 &  0.1021E+14 \\  
 184 &  53.82 & --28.68 & 301.7 &  13.0 &  29.4 &  15.2 &   1.1 &   6.2 &  10.8 &   6.5 &   156 &     1 &  0.2297E+11 &  0.2512E+13 \\  
 185 &  53.93 & --29.63 & 393.8 &  19.0 &  51.6 &  18.6 &   1.6 &  18.8 &   8.6 &   5.6 &   151 &     7 &  0.3211E+11 &  0.4318E+13 \\  
 190 & 327.23 & --30.67 & 352.2 &  19.0 &  43.0 &  15.1 &   1.6 &  11.7 &   9.9 &   6.0 &   122 &     5 &  0.2405E+11 &  0.2583E+13 \\  
 200 & 330.81 & --24.36 & 466.5 &  30.0 &  61.1 &  24.6 &   1.4 &   2.7 &  24.2 &   8.7 &   155 &     6 &  0.4344E+11 &  0.1242E+14 \\  
 204 & 331.43 & --27.84 & 268.2 &  16.0 &  44.0 &  18.0 &   1.4 &   5.6 &   9.7 &   5.8 &   342 &     5 &  0.6541E+11 &  0.4041E+13 \\  
 205 & 331.45 & --25.20 & 515.4 &  13.0 &  38.4 &  16.4 &   1.4 &   5.9 &   8.9 &   6.0 &    23 &     3 &  0.6376E+11 &  0.3097E+13 \\  
 209 & 332.72 & --29.87 & 465.8 &  20.0 &  45.8 &  20.2 &   1.3 &   6.5 &  13.4 &   6.8 &    91 &     5 &  0.3213E+11 &  0.5512E+13 \\  
 217 & 334.75 & --34.76 & 449.1 &  66.0 & 126.4 &  39.8 &   1.8 &  23.4 &  18.1 &   6.9 &   938 &    42 &  0.3692E+11 &  0.4320E+14 \\  
 220 & 335.53 & --31.32 & 343.9 &  15.0 &  36.8 &  16.6 &   1.3 &   8.0 &  10.1 &   6.2 &   169 &     6 &  0.2286E+11 &  0.3292E+13 \\  
 221 & 335.77 & --29.33 & 506.6 &  20.0 &  43.8 &  16.8 &   1.5 &   6.5 &   9.3 &   6.1 &    37 &     7 &  0.2982E+11 &  0.3324E+13 \\  
 222 & 336.90 & --30.58 & 169.0 &  15.0 &  35.2 &  15.8 &   1.3 &   7.1 &  10.0 &   6.2 &   473 &     2 &  0.3426E+11 &  0.2660E+13 \\  
 229 & 341.30 & --31.91 & 505.2 &  13.0 &  33.1 &  15.8 &   1.2 &   3.3 &  11.1 &   6.6 &    41 &     2 &  0.2632E+11 &  0.2877E+13 \\  
 240 & 343.16 & --26.04 & 441.9 &  26.0 &  52.4 &  21.5 &   1.4 &   7.9 &  14.3 &   6.8 &   171 &     6 &  0.4852E+11 &  0.6829E+13 \\  
 247 & 345.22 & --31.62 & 514.6 &  13.0 &  29.9 &  15.4 &   1.1 &   3.2 &  11.6 &   6.8 &    28 &     2 &  0.2949E+11 &  0.2653E+13 \\  
 253 & 346.13 & --32.51 & 245.9 &  29.0 &  68.8 &  19.6 &   2.0 &  11.2 &  11.1 &   6.2 &   521 &     7 &  0.2588E+11 &  0.5180E+13 \\  
 260 & 347.89 & --29.08 & 337.5 &  18.0 &  39.8 &  18.5 &   1.2 &   5.6 &   9.5 &   6.3 &   220 &     4 &  0.2053E+11 &  0.4487E+13 \\  
 267 & 348.85 & --24.69 & 421.4 &  25.0 &  53.6 &  21.6 &   1.4 &  11.4 &  11.2 &   6.7 &   173 &     6 &  0.1890E+11 &  0.7051E+13 \\  
 270 & 350.71 & --28.24 & 506.4 &  21.0 &  51.2 &  17.2 &   1.7 &   7.6 &   9.6 &   6.1 &    37 &     8 &  0.3358E+11 &  0.3662E+13 \\  
 271 & 351.13 & --29.93 & 456.4 &  27.0 &  76.0 &  26.4 &   1.7 &   5.9 &  16.0 &   7.1 &   253 &     8 &  0.2550E+11 &  0.1349E+14 \\  
 276 & 352.36 & --30.15 & 306.9 &  29.0 &  61.8 &  20.4 &   1.8 &  18.8 &   9.1 &   5.8 &   371 &     8 &  0.1736E+11 &  0.5993E+13 \\  
 282 & 353.01 & --34.42 & 397.2 &  35.0 &  66.6 &  22.2 &   1.7 &  22.0 &  13.8 &   6.5 &   255 &    14 &  0.9439E+11 &  0.8168E+13 \\  
 303 & 357.53 & --26.99 & 452.1 &  22.0 &  41.0 &  16.7 &   1.4 &  10.1 &  10.0 &   6.1 &    71 &     5 &  0.3256E+11 &  0.3168E+13 \\  
 313 & 359.87 & --26.13 & 398.4 &  18.0 &  32.9 &  16.0 &   1.2 &   5.2 &   9.0 &   6.0 &    85 &     4 &  0.4653E+11 &  0.2611E+13 \\  
\hline
\end{tabular}
\end{table}