\begin{table}%t3
\caption{Part of the electronic multiband catalog.}\label{cat}
\small%\centerline
{
\begin{tabular}{ccccccccccccccccccc} 
\hline\hline \noalign{\smallskip}
ID&RA(J2000)&Dec(J2000)&$B$&$\sigma_B$&$V$&$\sigma_V$&$I$&$\sigma_I$&$J$&$\sigma_J$&$H$&$\sigma_H$&$K$&$\sigma_K$&X-ray emission$^{a}$&$\chi^2$&{\tt SHARP}&mul$^b$\\
\hline
   1760& 274.847168& --13.750009& 23.40& 0.14& 21.26& 0.04& 18.91& 0.04&  NA  &  NA  &  NA  &  NA   &  NA  &  NA       &  N  	 & 1.392&--0.028&    0\\
   1761& 274.730042& --13.749800& 22.46& 0.03& 20.10& 0.04& 17.33& 0.01& 15.42& 0.05& 14.27& 0.06& 13.74& 0.08&  N   & 1.563& 0.000&    0\\
   1762& 274.753571& --13.749639& 22.60& 0.04& 20.40& 0.02& 17.53& 0.02& 15.54& 0.06& 14.58& 0.06& 13.53&  NA  &Y& 1.811& 0.601&    1\\
   1763& 274.733673& --13.749538& 21.98& 0.01& 19.79& 0.02& 16.93& 0.01&  NA  &  NA  &  NA  &  NA  &  NA   &  NA  & Y& 1.563& 0.119&    0\\
   1764& 274.727478& --13.749289& 23.21& 0.10& 20.91& 0.04& 17.90& 0.01& 16.25& 0.11& 14.04&  NA  & 12.60&  NA      &  N      & 1.546& 0.059&    0\\
   1765& 274.752350& --13.749180&  NA  &  NA & 23.03& 0.19& 19.75& 0.07&  NA  &  NA  &  NA  &  NA  &  NA  &  NA     &  N      & 1.902&--1.558&    0\\
   1766& 274.828247& --13.749168& 22.88& 0.05& 21.09& 0.03& 18.74& 0.02&  NA  &  NA  &  NA  &  NA  &  NA  &  NA     &  N       & 1.381& 0.203&    0\\
   1767& 274.731903& --13.748953& 21.78& 0.05& 19.48& 0.01& 16.80& 0.01& 14.83& 0.11& 13.68& 0.09& 13.05& 0.06& Y& 1.573&--0.091&    0\\
   1768& 274.714508& --13.748638&  NA  &  NA &  NA  &  NA &  NA  &  NA & 16.12& 0.12& 13.77& 0.06& 12.67& 0.04& N 	  & 0.000& 0.000&    0\\
   1769& 274.827972& --13.748659&  NA  &  NA &  NA  &  NA  & NA  &  NA & 16.01& 0.10& 14.65& 0.06& 13.97& 0.06&  N 	  & 0.000& 0.000&    0\\
   1770& 274.737183& --13.748060& 15.56& 0.01& 14.66& 0.01& 13.60& 0.01& 12.70& 0.02& 12.35& 0.02& 12.12& 0.02& Y& 1.695& 0.049&    0\\
   1771& 274.738922& --13.747979& 23.97& 0.26& 22.11& 0.10& 18.67& 0.02& 16.44& 0.13& 15.13&  NA  & 14.30&  NA  &  N        & 1.609& 0.255&    0\\
   1772& 274.804474& --13.747979& 24.32& 0.23& 22.31& 0.07& 19.55& 0.04&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N       & 1.534& 0.491&    0\\
   1773& 274.817169& --13.747875& 20.79& 0.01& 19.32& 0.01& 17.60& 0.01& 16.15& 0.11& 15.27& 0.11& 14.25&  NA  &  N         & 1.162& 0.033&    0\\ 
   1774& 274.829285& --13.747687& 24.58& 0.20& 22.56& 0.30& 19.63& 0.11&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N       & 1.647& 0.013&    0\\
   1775& 274.726166& --13.747549& 20.17& 0.01& 18.12& 0.01& 15.63& 0.01&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N       & 1.651& 0.073&    0\\
   1776& 274.722961& --13.747337& 23.17& 0.11& 20.97& 0.03& 18.75& 0.04&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N       & 1.499& 0.028&    0\\
   1777& 274.759338& --13.747359& 23.16& 0.10& 21.39& 0.04& 18.95& 0.07&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N       & 1.485& 0.183&    0\\
   1778& 274.756104& --13.747284& 22.18& 0.07& 20.35& 0.01& 18.26& 0.03&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N       & 1.311& 0.057&    0\\
   1779& 274.720978& --13.747194&  NA  &  NA & 22.64& 0.16& 18.94& 0.03&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N       & 1.816& --0.549&	0\\
   1780& 274.710754& --13.747069& 23.03& 0.27& 21.00& 0.05& 17.75& 0.03&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  & Y& 1.601&  0.010&   0\\
   1781& 274.806885& --13.747075& 22.61& 0.10& 20.46& 0.02& 17.45& 0.01& 15.37& 0.06& 14.37& 0.05& 14.02& 0.08&  N    	    & 1.630&  0.145&   0\\
   1782& 274.764679& --13.746936& 24.01& 0.29& 22.23& 0.14& 19.10& 0.08&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N 	    & 1.530&  0.050&   0\\
   1783& 274.707275& --13.746615&  NA  &  NA & 21.92& 0.37& 18.50& 0.04& 14.96& 0.05& 13.40& 0.05& 12.43& 0.04&  N    	    & 1.712& --0.387&   0\\
   1784& 274.804321& --13.746662&  NA  &  NA & 22.59& 0.25& 20.08& 0.07&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N 	    & 1.544& --0.059&   0\\
   1785& 274.746338& --13.746284& 23.35& 0.20& 20.98& 0.03& 17.88& 0.01& 15.61& 0.07& 14.55& 0.05& 13.99& 0.06&  N    	    & 1.510&  0.156&   0\\
   1786& 274.791351& --13.488843&  NA  &  NA & 21.92& 0.11& 18.65& 0.05&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N 	    & 2.398& --0.308&   0\\
   1787& 274.801392& --13.745899& 23.08& 0.08& 20.70& 0.02& 17.75& 0.01& 15.46& 0.05& 14.31& 0.03& 13.48& 0.03&  N    	    & 1.903&  0.086&   0\\
   1788& 274.726746& --13.745795& 24.59& 0.38& 22.33& 0.09& 19.48& 0.04&  NA  &  NA  &  NA  &  NA  &  NA  &  NA  &  N 	    & 1.612&  0.256&   0\\
\hline
\noalign{\smallskip}\multicolumn{19}{l}{If $\chi^2$ and {\tt SHARP} are equal to 0 then the source was observed in only an optical band, and was not possible to calibrate the magnitude.} \\ 
\multicolumn{19}{l}{NA is for "Not Available''.}
\end{tabular}}
\smallskip
$^a$ If equal to Y then the star has an X-ray counterpart.\\
$^b$  If equal to 1 the star is characterized by a multiple identification. 
\end{table}