\begin{table} %t2
\caption{\label{mastercatalogo}Results of the cross-identifications.}
\small%\centerline
{
\begin{tabular}{rrrr}
\hline
\hline
Number of stars& Optical detection & NIR~detection & X-ray detection \\
\hline
$12~561$		&$yes$		&$no$		&$no$\\
$16~390$		&$no$		&$yes$		&$no$\\
$9156$		&$yes$		&$yes$		&$no$\\
$332$		&$yes$		&$no$		&$yes$\\
$33$		&$no$		&$yes$		&$yes$\\
$522$		&$yes$		&$yes$		&$yes$\\
$38~995$         &\multicolumn{3}{r} {Total of stars in the multiband catalog}\\ 
\hline
\end{tabular}}
\smallskip
 The X-ray sources without optical and 2MASS counterpart are 148.
 \end{table}