\begin{table}%t2
\caption{\label{linetab}Observed wavelengths, equivalent widths, 
and FWHM of all identified emission
lines in the 2002 and 2003 spectrum of TV~Ret. For 2003 the line 
flux is also given. 
Note that the uncertainty of the line flux describes the 
uncertainty of the relative flux in the line and does not include the
photometric error. The line flux has been dereddened using the reddening laws
for H~II regions and for AGNs (see text for details).}
\small%\begin{center}
{
\begin{tabular}{l r r r r r r r r r}
\hline
\hline
            & \multicolumn{6}{c}{September 2003} & ~ ~ ~ ~ & \multicolumn{2}{c}{November 2004}\\
Transition & 
\multicolumn{1}{c}{$\lambda_{\rm obs}$ [nm]} & 
\multicolumn{1}{c}{$-W$ [nm]}  &
\multicolumn{1}{c}{$ F [10^{-18}$~W~m$^{-2}]$} & 
\multicolumn{1}{c}{$F_{\rm SB~dered}$} & 
\multicolumn{1}{c}{$F_{\rm AGN~dered}$} & 
\multicolumn{1}{c}{$ 100\cdot F_{\rm SB~dered} / F_{\rm H\beta}$} & &
\multicolumn{1}{c}{$\lambda_{\rm obs}$ [nm]} & 
\multicolumn{1}{c}{$-W$ [nm]} \\
 \noalign{\smallskip}
\hline
 H$_\alpha$   & 719.47 & 46.0 & 3.51(3) & 4.55 & 3.85 & 285(10) & & 719.42 & 46.1 \\
 H$_\beta$    & 532.97 & 10.5 & 1.08(2) & 1.60 & 1.24 & 100(4) & & 533.16 & 9.0 \\
 H$_\gamma$   & 475.97 &  3.5 & 0.46(2) & 0.72 & 0.54 &  45(3) & & 476.14 & 3.4 \\
 H$_\delta$   & 449.76 &  1.8 & 0.26(5) & 0.42 & 0.31 &  26(6) & & 450.01 & 1.4 \\
 H$_\epsilon$ & 434.94 &  1.8 & 0.26(2) & 0.42 & 0.31 &  26(3) & & 435.48 & 1.2 \\
 H$_8$        & 425.83 &      & & & & & & 426.68 \\
{[}S~II]: 673.1  & 737.81 &  3.1 & 0.24(2) &      &      &  15(2) & & 737.58 &     \\
{[}S~II]: 671.7  & 736.36 &  3.7 & 0.29(2) & 0.68 & 0.58 &  18(2) & & 736.20 & 6.8 \\
{[}N~II]: 658.4  & 721.70 &  3.6 & 0.28(3) & 0.36 & 0.31 &  23(3) & & 721.64 & 3.9 \\
{[}O~I]: $630.0^{(1)}$&691.20&2.3& 0.17(2) & 0.22 & 0.19 &  14(2) & &        & 1.6 \\
He~I: 587.56 & 644.12 &  2.2 & 0.20(2) & 0.27 & 0.22 &  17(2) & & 644.20 & 2.0 \\
{[}O~III]: 500.7 & 548.95 & 47.2 & 5.23(2) & 7.61 & 5.97 & 477(15) & & 549.04 & 50.4 \\
{[}O~III]: 495.9 & 543.69 & 16.0 & 1.73(2) & 2.53 & 1.98 & 159(6) & & 543.82 & 17.1 \\
{[}O~III]: 436.3 & 478.53 &  0.6 & 0.07(1) & 0.11 & 0.08 &   7(1) & & 478.57 & 0.5 \\
{[}Ne~III]: 386.8& 423.44 &  3.1 & 0.48(3) & 0.78 & 0.57 &  49(4) & & 424.42 & 3.0 \\
{[}O~II]: 372.7  &        &      &         &      &      & 169(15) & & 408.93 & 16.2\\
\hline 
\end{tabular}}
\parbox{17.5cm}{
(1): Blend of several O~I lines.}
%\end{center}
\end{table}