\begin{table}%t3
\caption{SMC line measurement results.}\label{tab:resultats_SMC}
%\centering
\small
\begin{tabular}{lrrrrrrrrr}
\hline
\hline
Object & $F$(\hb) & \oiii~ 4959+5007&\ha  & $c$(\hb) & \oiii / \hb  & $I$(\hb) &
$L$(\hb)& Radius & $\langle$$N_{\rm e}$$\rangle$\\ 
SMC & 
$10^{-16}$&
$10^{-16}$&
$10^{-16}$&
&
&
$10^{-16}$&
$10^{26}$&
pc&
\unit[-3]{cm}
\\
&\unit{W}/\unit[2]{m}  &
\unit{W}/\unit[2]{m}  &
\unit{W}/\unit[2]{m}  &
&
&
\unit{W}/\unit[2]{m}  &
\unit{W} &&\\
\hline
          N~10 &    2.7 &    7.0 &   12.3 &   0.64 &   2.43 &   11.9         &    605 &  3.0 &     40\\
          N~11 &    9.1 &   14.7 &   34.5 &   0.40 &   1.60 &   23.2         &   1180 &  1.0 &    270\\
          N~21 &    2.9 &    3.5 &   11.1 &   0.42 &   1.18 &    7.6         &    387 &  0.6 &    360\\
          N~26 &   12.7 &   71.2 &   60.4 &   0.73 &   5.32 &   67.8         &   3440 &  0.5 &   1350\\
          N~31 &    2.2 &   -0.1 &    8.8 &   0.46 &  -0.06 &    6.5         &    329 &  0.4 &    660\\
          N~32 &   13.1 &    6.7 &   46.8 &   0.32 &   0.50 &   27.1         &   1377 &  1.4 &    190\\
          N~33 &   11.0 &   67.6 &   45.3 &   0.51 &   5.89 &   36.1         &   1834 &  0.5 &    920\\
          N~45 &   11.9 &   73.9 &   45.9 &   0.43 &   6.02 &   31.9         &   1621 &  1.4 &    190\\
          N~64 &    8.2 &   32.8 &   31.7 &   0.42 &   3.86 &   21.8         &   1107 &  1.5 &    150\\
          N~68 &    1.8 &   10.6 &   12.2 &   1.26 &   5.47 &   32.0         &   1625 &  0.4 &   1380\\
          N~75 &    1.2 &    0.2 &    5.3 &   0.63 &   0.15 &    5.1         &    259 &  2.6 &     30\\
          N~77 &   14.9 &   55.7 &   59.1 &   0.47 &   3.62 &   43.6         &   2214 &  1.7 &    180\\
          N~81 &  124.9 &  915.4 &  403.3 &   0.17 &   7.23 &  186.1         &   9451 &  1.1 &    750\\
         N~88A &   88.0 &  871.7 &  368.5 &   0.54 &   9.51 &  307.1         &  15594 &  0.5 &   2620\\
\hline
\end{tabular}
\end{table}