\begin{table}%T2
\caption{Optical Geneva and near-IR photometry of MACHO~47.2496.8, together
with their JD and phase. The Geneva $R$ and $I$ are from the Gunn resp. Cousins
photometric systems.}\label{tab:allnearirdt}
\small
%\centerline
 {
\begin{tabular}{rrrrrrr}
\hline\hline
   JD     & Phase &   $U$   &  $B$    &   $V$    &   $R$  & $I$\\
\hline
\multicolumn{7}{c}{Geneva}\\
2~453~759.6 & 0.02 & 19.15 & 16.81 & 15.94 & 15.18 & 14.66 \\
\hline
   JD     & Phase &   $I$   &  $J$    &   $H$    &   $K$  &\\
\hline
\multicolumn{7}{c}{SAAO}\\
2~450~437.4 &  0.62 &       & 13.18 &  12.67 &  12.54 &\\
2~4504~38.3 &  0.62 &       & 13.20 &  12.56 &  12.29 &\\
Mean      &  0.62 &       & 13.19 &  12.61 &  12.41 &\\
$\sigma$  &       &       &   .04 &    .04 &    .05 &\\
\hline
\multicolumn{7}{c}{2MASS}\\
2~451~111.8 &  0.58 &       & 13.12 &  12.71 &  12.51 &\\
$\sigma$  &       &       &   .03 &    .04 &    .04 &\\
\hline
\multicolumn{7}{c}{DENIS}\\
2~450~377.8 &  0.09 & 14.02 & 13.22 &        &  12.53 &\\
$\sigma$  &       &   .03 &   .08 &        &    .13 &\\
\hline
\end{tabular}
}
\smallskip 
{The Geneva $R$ can be converted to $R_{\rm C}$, the Cousins $R$ magnitude, by the
conversion forumula from \citet{schombert90}, yielding $R_{\rm C}=14.89$.}
\end{table}