\begin{table}%T1
\caption{\label{table:dep}Depolarization factors and integrated polarization for the $P_1(1.5)$ and $R_2(0.5)$  lines of the CN~(0,~0) band.
The $W_{\rm H}$ values have been calculated with Eq.~(2.12) from \citet{stenflo1982}.}  \small
%\centering
\par
\begin{tabular}{c | c  c | c  c}  
\hline\hline  
  &  \multicolumn{2}{c}{$P_1(1.5)$} &  \multicolumn{2}{|c}{$R_2(0.5)$} \\
% \noalign{\smallskip}
$H$, [G]     & $W_{ \rm H }$ &   $ \overline{W}_{{\rm H}}(B) $ & $W_{ \rm H} $   & $\overline{W}_{\rm H}(B)$ \\\hline  
0  &  1.000  &    1.000   &   1.000          &       1.000  \\
1  &  0.376  &     0.375  &   0.689          &   0.687    \\
5  &  0.209  &     0.209  &   0.260          &  0.259    \\
10  &  0.202  &    0.202   &   0.216        &   0.215   \\
20  &  0.200  &    0.201 &   0.204         &   0.202     \\
40  &  0.200  &    0.204  &  0.201            &   0.195   \\
60  &  0.200  &     0.210 &   0.200          &     0.188   \\
80  &  0.200  &      0.222   &  0.200         &     0.182    \\
100  &  0.200  &     0.240  &    0.200         &     0.175  \\
120  &  0.200  &     0.265  &  0.200   &           0.170     \\
140  &  0.200  &     0.295  &  0.200    &          0.166   \\
160  &  0.200  &     0.328  &   0.200    &         0.163    \\
180  &  0.200  &     0.363   &    0.200   &           0.162  \\
200  &  0.200  &     0.396   &    0.200    &       0.161   \\
\hline 
\end{tabular}
\end{table}