\begin{table}%t4
\caption{Rest wavelength, along with the observed luminosity and the luminosity predicted by the LOC~model of the broad UV~lines as measured by FUSE (labeled~1) and HST-STIS (labeled~2). For each observed blended-line, the value of Lum$_{\rm LOC}$ consistently refers to the summed contribution of the lines in the blend.}\label{t:broad_lines} 
\small%\centerline
{
\begin{tabular}{lllllll}
\hline\hline
&  Ion  & Wavelength  & Lum$_{\rm obs}$ 		& Lum$_{\rm LOC}$ & Inst & Notes\\
&	& (\AA )	& ($10^{41}$ erg s$^{-1}$)& ($10^{41}$ erg s$^{-1}$)&	 &\\
\hline
&\svi\ & $933+944$	& $<$2.9	& 5.7				& 1 &	\\		
&\ciii\ & 977		& 10.7 $\pm$ $2.5$	& 68.0				& 1&	\\
&\niii\ & 989+991	& $<$2.52	& 2.2				& 1&	\\
&\Lyb\ + \ovi\    & $1025+1032+1038$	& 31 $\pm$ $6$	& 30.4		& 1&	\\
&\heii\	& 1085		& 1.6 $\pm$ $0.6$		& 2.4				& 1&	\\
&\Lya\	& 1216		& 75.7 $\pm$ $ 19.4$	& 75.7				& 2& 1	\\
&\nv\	& $1238+1242$	& 13.6 $\pm$ $ 6.0$		& 13.4				&2&	\\
&\oi\ +\siII\	& 1304	& 3.1 $\pm$ $ 0.6$ 	&3.7				& 2&	\\
&\cii\		& 1335	& 1.3 $\pm$ $ 0.4$	&2.0				&2&	\\
&\siiv\		& $1393+1403$& 11 $\pm$ $2$	&13.7				&2& 2	\\
&\civ\		&$1548+1551$&	70 $\pm$ $ 12$ 	& 42.9				&2&	\\
&\heii\		&1640	&	17 $\pm$ $ 4$	& 13.8			&2&	3\\
\hline
\end{tabular}}
\medskip
Notes: (1) Blended with \ov] (1218~\AA) and \heii\ (1216~\AA); (2) blended also 
with the \oiv] quintuplet (1402~\AA) and the \siv] quintuplet (1406~\AA); (3) 
blended with the \oiii] doublet (1661$+$1666~\AA).
\end{table}