\begin{table}%t2
\caption{Fit parameters of a power-law plus modified blackbody fit
to the total spectrum of~\mrk. The errors on the parameters are only statistical and 
do not include any systematic uncertainty. The fit was restricted to
the 1.9--110~\AA\ range. The spectra were binned by a~factor of~10 before
spectral fitting.}\label{tab:contpar}
%\centering
\small
\begin{tabular}{llll}
\hline
\hline
$\Gamma$ & $L_{{\rm 2-10~keV}}$ & $T_{{\rm mbb}}$ & $L_{{\rm mbb}}$  \\
	&$10^{43}$~erg~s$^{-1}$	& keV		&  $10^{43}$~erg~s$^{-1}$  \\
\hline
2.01 $\pm$ 0.01 &  9.3 $\pm$ 0.2 & 0.108 $\pm$ 0.002 &  9.2 $\pm$ 0.5  \\
\hline
\end{tabular}
\end{table}