\begin{table}%t6
\caption{Revised fundamental parameters of the M0~giant $\gamma$~Sagittae
based on the analysis of this paper. For the details of the calculation,
see the text.}
\label{tab:fundpar}
%\centering
\small
\begin{tabular}{ll}
\hline\hline
Parameter & Value \\\hline
Rosseland angular diameter & $\Theta_{\rm Ross}=6.06\pm 0.02$~mas\\
Rosseland linear radius  & $R_{\rm Ross}=55\pm 4~R_\odot$\\
Bolometric flux & $f_{\rm bol}=(2.57\pm 0.13)\times 10^{-9}$~W/m$^2$\\
Effective temperature & $T_{\rm eff}=3805\pm 55$~K\\
Luminosity & $\log L/L_\odot=2.75\pm 0.08$\\
Mass & $M=1.4\pm 0.4~M_\odot$\\
Surface gravity & $\log g=1.1\pm 0.2$\\\hline
\end{tabular}
\end{table}