\begin{table}%tA.3
\caption{Our refit of the \citet{Izzard_et_al_2003b_AGBs} HBB~calibration \mbox{parameters}.}\label{tab:HBB-refit-parameters}
%\centering
\small
\begin{tabular}{cccccc} 
\hline \hline 
$M/{M}_{\odot}$ & $Z$ & $N_{\rm rise}$ & $f_{\rm burn}$ & $f_{\rm HBB}$ & $f_{\rm T}$ \\
\hline
4.0 & 0.0001 & 1.68 & 0.94 & 0.62 & 1 \\ 4.0 & 0.004 & 3.18 & 0.34 & 0.585 & 0.998 \\ 4.0 & 0.008 & 2.98 & 0.09 & 0.09 & 1 \\ 4.0 & 0.02 & 3 & 0.0 & 0.0 & 1 \\ 5.0 & 0.0001 & 0.76 & 0.13 & 0.99405 & 1.0055 \\ 5.0 & 0.004 & 2.52 & 1.5 & 0.64 & 1.00048 \\ 5.0 & 0.008 & 2.743 & 1.33 & 0.75 & 1 \\ 5.0 & 0.02 & 2.52 & 1.21 & 0.144 & 1 \\ 6.0 & 0.0001 & 1.0619 & 0.892308 & 0.716098 & 1.00059 \\ 6.0 & 0.004 & 0.16 & 0.92 & 0.758 & 1 \\ 6.0 & 0.008 & 1.58 & 1.0413 & 0.6913 & 0.99975 \\ 6.0 & 0.02 & 1.1 & 1.5 & 0.54 & 1 \\ 6.5 & 0.0001 & 1.19292 & 0.91236 & 0.689636 & 1.00043 \\ 6.5 & 0.004 & 1.05016 & 0.947269 & 0.696531 & 1.00019 \\ 6.5 & 0.008 & 1.40533 & 0.992912 & 0.66681 & 1.00007 \\ 6.5 & 0.02 & 1.55 & 0.96 & 0.55 & 1 \\ 
\hline
\end{tabular}
\end{table}