\begin{table}%t1
  \caption{Observed photometric properties for V5114 Sgr.}
  \label{LCProp}
%\centering
\small
  \begin{tabular}{p{0.4\linewidth}l r}
    \hline
    \hline
    $t_0$   &  JD =  2~453~081.556 \\
    $t_2$   &  11~days \\
    $t_3$   &  21~days \\
    $m_{V,{\rm max}}$ & 8.0~mag \\
    $(B-V)_{\rm max}$ & 0.66~mag \\ 
    $(B-V)_{t_2}$ & 0.38~mag \\ 
    $(B-V)_{15{\rm d}}$ & 0.25~mag \\ 
    \hline
    \end{tabular}
  \end{table}