\begin{table}%t3
%\centering
\par
\caption{Input parameters for the final model of NGC 5907. At the left hand side
the physical quantities at $R_0=10$~kpc are given and at the
right hand side the corresponding normalised parameters of the normalised
profile.
The corresponding description is given in Sect.~\ref{scaling}. 
\label{tabinp}}
\begin{tabular}{lrlr} \hline\hline
 \multicolumn{2}{c}{at $R_0=10~\rm kpc$} & \multicolumn{2}{c}{scaling parameter}
         \\ \hline
$z_{\rm s}$ [pc] & 520 & $\sigma_{\rm e}$ [km~s$^{-1}$] & 32 \\
$\Sigma_{\rm s} [\msun ~{\rm pc}^{-2}]$ & 18.7 & $Q_{\rm s}$ & 0.25 \\
$\Sigma_{\rm g}$ & 8.8 & $Q_{\rm g}$ & 0.11 \\
$\Sigma_{\rm h}$ & 48.5 & $Q_{\rm h}$ & 0.64 \\
$\sigma_{\rm h}$[km~s$^{-1}$] & 110 & $s_{\rm h}$ & 3.5 \\
$z_{\rm g}$ [pc] & 110 & $t_{\rm g}$ [Gyr] & 3.0 
\\ \hline
\end{tabular}
\end{table}