\begin{table}%t2
\caption{The Stellar Mass Density.}\label{tabmd}
\small%\centerline
{
\begin{tabular}{ccccc}
\hline
\hline
\multicolumn{1}{c}{$\langle z \rangle$}  &  \multicolumn{1}{c}{Schechter} &
\multicolumn{1}{c}{Observed}  &  \multicolumn{1}{c}{Schechter} &
\multicolumn{1}{c}{Observed}\\
\multicolumn{1}{c}{ }  &  \multicolumn{1}{c}{ $8<\log~{(M/M_\odot)}<13$} &
\multicolumn{1}{c}{}  &  \multicolumn{1}{c}{$\log~{(M/M_\odot)}>11$} &
\multicolumn{1}{c}{$\log~{(M/M_\odot)}>11$}\\
\hline
0.50 & 8.46 & $\rm 8.32^{+0.03}_{-0.03}$  &  8.10  & $\rm 7.89^{+0.13}_{-0.13}$\\
0.70 & 8.37 & $\rm 8.53^{+0.02}_{-0.02}$  &  8.01  & $\rm 8.24^{+0.07}_{-0.07}$\\
0.90 & 8.29 & $\rm 8.16^{+0.03}_{-0.03}$  &  7.93  & $\rm 7.90^{+0.10}_{-0.11}$\\
1.15 & 8.18 & $\rm 8.26^{+0.02}_{-0.02}$  &  7.83  & $\rm 7.94^{+0.06}_{-0.06}$\\
1.45 & 8.07 & $\rm 7.96^{+0.03}_{-0.03}$  &  7.70  & $\rm 7.57^{+0.09}_{-0.09}$\\ 
1.80 & 7.94 & $\rm 7.90^{+0.04}_{-0.04}$  &  7.54  & $\rm 7.50^{+0.09}_{-0.09}$\\
2.50 & 7.68 & $\rm 7.60^{+0.04}_{-0.04}$  &  7.19  & $\rm 7.16^{+0.08}_{-0.08}$\\
3.50 & 7.27 & $\rm 7.23^{+0.12}_{-0.12}$  &  6.48  & $\rm 6.60^{+0.16}_{-0.17}$\\
4.50 & ~ & $7.73                $  &  ~ & $6.44                $\\
5.50 & ~ & $7.84                $  &  ~  & $7.71                $\\
\hline 
\end{tabular}}
\medskip
The Stellar Mass Density at different redshift bins: the second column shows
the fitted SMD (integrated from log~$(M_*/M_\odot)=8$ to log~$(M_*/M_\odot)=13$),
the third the observed SMD, while the fourth and the fifth columns are
the fitted and observed SMD for log~$(M_*/M_\odot)>11$.
\end{table}