\begin{table}%t1
%\centering
\par
\begin{footnotesize}
%\centering
\par
\caption{List of observed QSOs. Redshifts for the QSOs reported in
   the literature (Col.~3) are compared to the redshift determined
   from the IFS data cube (Col.~4).  The  "--'' signs correspond to
   data where we could not reliably determine the QSO redshift from
   the emission lines in the IFS data cubes. Redshifts are derived
   from the vacuum corrected wavelengths. Column~5 gives the QSO
   magnitudes in the Vega system, and Col.~6 the seeing in
   arcseconds measured in the data cubes.  Column~7 lists the total
   integration time and the last column is the class of object defined
   from radio observations.  
  \label{tab:qlya_list_obj}}
  \begin{tabular}{llllllll}
   \hline \hline
   \noalign{\smallskip}
 (1)& (2) &(3) & (4) & (5) & (6) & (7) &(8)\\
  Coordinate name & Alt. name & $z_{{\rm em}}$ (ref) & $z_{{\rm em}}$ (cube) &  mag (cube)  & Seeing & Exposure time (s) & Class\\
   \hline
   \noalign{\smallskip}
\object{Q0953+4749} & \object{PC 0953+4749}& 4.457&   --  & $R=20.0$
   &1.0 & 16~200 & RQQ  \\
   \noalign{\smallskip}
\object{Q1347+112}&                        & 2.679& 2.679 & $V=18.7$ &   0.6
   & 12~600 & RQQ\\
   \noalign{\smallskip}
\object{Q1425+606}& \object{SBS 1425+606}  & 3.17 & 3.203 & $V=16.5$ & 1.0 &
   10~800 & RQQ \\
   \noalign{\smallskip}
\object{Q1451+1223}& \object{B1451+123}    & 3.246& 3.261 & $V=18.6$ &  0.8
   & 12~600  & RQQ\\
   \noalign{\smallskip}
\object{Q1759+7539}& \object{GB2 1759+7539}& 3.050 & 3.049  & $V=17.0$
   &1.2 & 12~600 & RLQ \\
   \noalign{\smallskip}
\object{Q1802+5616}&\object{PSS J1802+5616}& 4.158&-- & $R=20.7$  &
   1.0 & 27~000 & RQQ \\
   \noalign{\smallskip}
\object{Q2233+131}&         & 3.298&--  & $V=18.3$  & 0.7 & 18~000 &  RQQ \\
   \hline
  \end{tabular}
  \end{footnotesize}
\end{table}