\begin{table}%t5
\caption{Main parameters of the four component model of the pulsed emission
of the Crab pulsar.\label{tab:mcmodel}}
%\begin{center}
 {\begin{tabular}{cccc}
\hline\hline
\noalign{\smallskip}
Component & $E_{\rm p}$ & $E_{\rm c}$ & $L_{\rm bol}(^*)$    \\
          & MeV   & GeV & erg/s  $10^{36}$ \\
\hline
\noalign{\smallskip}
$C_O$     & $12.2\times 10^{-3}$ & --- & 2.8   \\
$C_X$ & $178\times  10^{-3}$ & ---  & 3.8 \\
$C_{O\gamma}$ &  300 & $\leq$15  & 0.97 \\
$C_{X\gamma}$ & 2000 & $\sim$15 & 0.92  \\
\hline  
\end{tabular}}
\parbox{6.5cm}{
$(^*)$ Assuming isotropic emission ($\omega_a = 4\pi$).} 
%\end{center}
\par
\end{table}