\begin{table}%t2
\caption{Photometry of Gl86~A and B.
\label{table:2}}
%\centerline
{\begin{tabular}{llll}     % 7 columns
\hline\hline\noalign{\smallskip} 
% To combine 4 columns into a single one
Component         &  $J$  & $H$    &  $K$          \\
    &  (mag)         &  (mag)    & (mag)               \\
\noalign{\smallskip} \hline\noalign{\smallskip} 
Gl86~A$^{a}$ & $4.79 \pm 0.03$ & $4.25 \pm 0.03$ & $4.13 \pm 0.03$      \\
Gl86~B$^{b}$ & $14.7 \pm 0.2$ & $14.4 \pm 0.2$ & $13.7 \pm 0.2$     \\
Gl86~B$^{c}$ & $12.9 \pm 0.3$ & $13.1 \pm 0.2$ & $12.8 \pm 0.2$     \\
 \hline
\end{tabular}}
\par
\smallskip
 $^{{a}}$  From the 2MASS All-Sky Catalog \citep{cutr03}.\\
 $^{{b}}$  From \citet{els2001}.\\
 $^{{c}}$  From $^{{\rm a}}$ and NACO measurements
presented in this work.
\end{table}