\begin{table}%t3
%\centering
\par
\caption{Parameters of best-fitting King model (core radius, $r_{\rm c}$, tidal radius, $r_{\rm t}$), 
Sersic model (Sersic radius, $R_{\rm S}$, shape parameter, $m$), exponential model (scale radius, $r_{\rm s}$) 
and Plummer model (scale radius, $b$) 
for all stellar populations, intermediate age and old stellar components in Fornax dSph. For each model 
we also compute the half-number radius, $r_{\rm h}$; for the Plummer model this coincides with $b$. The 
errors in the parameters are formal errors from the fitting procedure.
\label{tab:par_oldint}}
\begin{tabular}{lccccccccc}
\hline
\hline
\multicolumn{1}{l}{{}} &  \multicolumn{3}{c}{{King}} & \multicolumn{3}{c}{{Sersic}} &
\multicolumn{2}{c}{{Exponential}} & \multicolumn{1}{c}{{Plummer}} \\
% &  King &  & Sersic & & Exponential & Plummer \\
\hline
  & $r_{\rm c}[']$  & $r_{\rm t}[']$ & $r_{\rm K,h}[']$ & $R_{\rm S}[']$  & $m$ & $r_{\rm S,h}[']$ & 
$r_{\rm s}[']$ & $r_{\rm Ex,h}[']$ & $b[']$ \\
All            &   17.6~$\pm$~0.2 & 69.1~$\pm$~0.4 & 19.1 & 17.3~$\pm$~0.2 & 0.71 $\pm$ 0.01 & 18.6 &
 11.0~$\pm$~0.1 & 18.5 & 19.6~$\pm$~0.1\\
Intermediate   &   15.7~$\pm$~0.2 & 68.5~$\pm$~0.4 & 18.1 & 16.7~$\pm$~0.2 & 0.69 $\pm$ 0.01 & 17.5 &
 10.0~$\pm$~0.1 & 16.7 & 17.1~$\pm$~0.1\\
Old            &   26.8~$\pm$~1.1 & 77.2~$\pm$~1.6 & 23.7 & 24.6~$\pm$~0.8 & 0.62 $\pm$ 0.02 & 23.5 & 
 13.7~$\pm$~0.2 & 23.0 & 24.6~$\pm$~0.4\\
\hline
\end{tabular}
\end{table}