\begin{table}%t2
\caption{Iron line data. $\Gamma$ and $\alpha$ are the Van der Waals {\it FWHM} per perturber at 10~000~K and velocity parameter, respectively. The damping constants for the lines marked with a~$\dagger$ correspond to the modified Uns\"old approximation. The last column gives the equivalent widths measured in the spectrum of BD~+17~4708.}
\label{t:linedata}
%\centering
\small
 {
\begin{tabular}{cccrclr} 
\hline\hline
Wavelength &	Species & E.P.	&	$\log gf$	&	$\log\Gamma$	&	$(1-\alpha)/2$ & {\it EW} \\	
\AA &	& eV	&	&	rad cm$^3$ s$^{-1}$ &	& m\AA \\	
\hline
4630.120	&	\ion{Fe}{i}	&	2.279	&	$-2.52$	&	$-7.518$	&	0.373	&	7.0	\\
4745.800	&	\ion{Fe}{i}	&	3.654	&	$-1.27$	&	$-7.356$	&	0.300 $\dagger$ 	&	8.6	\\
4939.686	&	\ion{Fe}{i}	&	0.859	&	$-3.34$	&	$-7.748$	&	0.377	&	23.9	\\
4994.129	&	\ion{Fe}{i}	&	0.915	&	$-3.07$	&	$-7.744$	&	0.377	&	28.0	\\
5012.068	&	\ion{Fe}{i}	&	0.859	&	$-2.64$	&	$-7.751$	&	0.377	&	53.0	\\
5044.211	&	\ion{Fe}{i}	&	2.851	&	$-2.03$	&	$-7.280$	&	0.381	&	8.3	\\
5051.634	&	\ion{Fe}{i}	&	0.915	&	$-2.79$	&	$-7.746$	&	0.377	&	42.3	\\
5079.740	&	\ion{Fe}{i}	&	0.990	&	$-3.22$	&	$-7.739$	&	0.378	&	20.1	\\
5110.413	&	\ion{Fe}{i}	&	0.000	&	$-3.76$	&	$-7.826$	&	0.373	&	42.4	\\
5123.720	&	\ion{Fe}{i}	&	1.011	&	$-3.07$	&	$-7.739$	&	0.378	&	26.0	\\
5127.359	&	\ion{Fe}{i}	&	0.915	&	$-3.31$	&	$-7.749$	&	0.377	&	19.9	\\
5150.839	&	\ion{Fe}{i}	&	0.990	&	$-3.00$	&	$-7.742$	&	0.377	&	23.0	\\
5151.911	&	\ion{Fe}{i}	&	1.011	&	$-3.32$	&	$-7.740$	&	0.377	&	17.3	\\
5166.282	&	\ion{Fe}{i}	&	0.000	&	$-4.20$	&	$-7.827$	&	0.373	&	21.2	\\
5171.596	&	\ion{Fe}{i}	&	1.485	&	$-1.78$	&	$-7.688$	&	0.373	&	63.4	\\
5194.941	&	\ion{Fe}{i}	&	1.557	&	$-2.08$	&	$-7.680$	&	0.373	&	45.1	\\
5216.273	&	\ion{Fe}{i}	&	1.608	&	$-2.14$	&	$-7.674$	&	0.372	&	39.4	\\
5227.189	&	\ion{Fe}{i}	&	1.557	&	$-1.23$	&	$-7.681$	&	0.373	&	90.1	\\
5228.376	&	\ion{Fe}{i}	&	4.220	&	$-1.19$	&	$-7.233$	&	0.361	&	4.4	\\
5253.461	&	\ion{Fe}{i}	&	3.283	&	$-1.57$	&	$-7.203$	&	0.386	&	6.2	\\
5307.360	&	\ion{Fe}{i}	&	1.608	&	$-2.98$	&	$-7.678$	&	0.373	&	11.8	\\
5322.041	&	\ion{Fe}{i}	&	2.279	&	$-2.89$	&	$-7.600$	&	0.382	&	4.2	\\
5328.531	&	\ion{Fe}{i}	&	1.557	&	$-1.85$	&	$-7.685$	&	0.374	&	62.0	\\
5332.899	&	\ion{Fe}{i}	&	1.557	&	$-2.78$	&	$-7.685$	&	0.374	&	16.0	\\
5341.023	&	\ion{Fe}{i}	&	1.608	&	$-1.95$	&	$-7.679$	&	0.373	&	52.5	\\
5371.489	&	\ion{Fe}{i}	&	0.958	&	$-1.65$	&	$-7.753$	&	0.376	&	95.9	\\
5373.708	&	\ion{Fe}{i}	&	4.473	&	$-0.74$	&	$-7.123$	&	0.359	&	6.5	\\
5397.127	&	\ion{Fe}{i}	&	0.915	&	$-1.99$	&	$-7.759$	&	0.375	&	81.7	\\
5429.696	&	\ion{Fe}{i}	&	0.958	&	$-1.88$	&	$-7.755$	&	0.376	&	87.8	\\
5432.947	&	\ion{Fe}{i}	&	4.445	&	$-0.94$	&	$-7.153$	&	0.360	&	7.2	\\
5434.523	&	\ion{Fe}{i}	&	1.011	&	$-2.12$	&	$-7.750$	&	0.377	&	72.5	\\
5473.900	&	\ion{Fe}{i}	&	4.154	&	$-0.72$	&	$-7.266$	&	0.380	&	8.4	\\
5497.516	&	\ion{Fe}{i}	&	1.011	&	$-2.85$	&	$-7.752$	&	0.376	&	41.0	\\
5501.465	&	\ion{Fe}{i}	&	0.958	&	$-3.04$	&	$-7.757$	&	0.375	&	32.4	\\
5506.779	&	\ion{Fe}{i}	&	0.990	&	$-2.80$	&	$-7.754$	&	0.376	&	42.1	\\
5543.935	&	\ion{Fe}{i}	&	4.217	&	$-1.04$	&	$-7.263$	&	0.381	&	5.1	\\
5638.262	&	\ion{Fe}{i}	&	4.220	&	$-0.77$	&	$-7.270$	&	0.382	&	6.8	\\
5701.544	&	\ion{Fe}{i}	&	2.559	&	$-2.22$	&	$-7.576$	&	0.382	&	8.5	\\
5905.671	&	\ion{Fe}{i}	&	4.652	&	$-0.69$	&	$-7.144$	&	0.359	&	6.0	\\
5930.179	&	\ion{Fe}{i}	&	4.652	&	$-0.17$	&	$-7.149$	&	0.359	&	24.8	\\
5934.654	&	\ion{Fe}{i}	&	3.928	&	$-1.07$	&	$-7.153$	&	0.377	&	7.6	\\
6003.012	&	\ion{Fe}{i}	&	3.881	&	$-1.06$	&	$-7.181$	&	0.380	&	7.8	\\
6027.050	&	\ion{Fe}{i}	&	4.076	&	$-1.09$	&	$-7.397$	&	0.300 $\dagger$	&	6.3	\\
6056.004	&	\ion{Fe}{i}	&	4.733	&	$-0.40$	&	$-7.130$	&	0.357	&	4.7	\\
6170.507	&	\ion{Fe}{i}	&	4.795	&	$-0.38$	&	$-7.119$	&	0.355	&	6.0	\\
6200.313	&	\ion{Fe}{i}	&	2.608	&	$-2.44$	&	$-7.588$	&	0.382	&	5.0	\\
6213.430	&	\ion{Fe}{i}	&	2.223	&	$-2.48$	&	$-7.691$	&	0.368	&	8.9	\\
6232.641	&	\ion{Fe}{i}	&	3.654	&	$-1.22$	&	$-7.498$	&	0.300 $\dagger$	&	7.9	\\
6265.133	&	\ion{Fe}{i}	&	2.176	&	$-2.55$	&	$-7.699$	&	0.369	&	11.2	\\
6344.148	&	\ion{Fe}{i}	&	2.433	&	$-2.92$	&	$-7.620$	&	0.377	&	3.9	\\
6419.949	&	\ion{Fe}{i}	&	4.733	&	$-0.24$	&	$-7.193$	&	0.363	&	12.0	\\
6609.110	&	\ion{Fe}{i}	&	2.559	&	$-2.69$	&	$-7.610$	&	0.377	&	4.2	\\
6750.152	&	\ion{Fe}{i}	&	2.424	&	$-2.62$	&	$-7.608$	&	0.380	&	6.9	\\
6841.338	&	\ion{Fe}{i}	&	4.607	&	$-0.71$	&	$-7.258$	&	0.367	&	5.7	\\
6855.162	&	\ion{Fe}{i}	&	4.558	&	$-0.74$	&	$-7.347$	&	0.300 $\dagger$	&	5.4	\\
7090.383	&	\ion{Fe}{i}	&	4.230	&	$-1.11$	&	$-7.165$	&	0.376	&	5.0	\\ 
4620.521	&	\ion{Fe}{ii}	&	2.828	&	$-3.21$	&	$-7.878$	&	0.347	&	7.4	\\
4629.339	&	\ion{Fe}{ii}	&	2.807	&	$-2.28$	&	$-7.886$	&	0.372	&	42.0	\\
5197.577	&	\ion{Fe}{ii}	&	3.230	&	$-2.22$	&	$-7.881$	&	0.377	&	32.5	\\
5234.625	&	\ion{Fe}{ii}	&	3.221	&	$-2.18$	&	$-7.881$	&	0.376	&	38.0	\\
5264.812	&	\ion{Fe}{ii}	&	3.230	&	$-3.13$	&	$-7.875$	&	0.350	&	7.1	\\
6432.680	&	\ion{Fe}{ii}	&	2.891	&	$-3.57$	&	$-7.899$	&	0.398	&	5.6	\\
6516.081	&	\ion{Fe}{ii}	&	2.891	&	$-3.31$	&	$-7.899$	&	0.399	&	8.8	\\
\hline
\end{tabular}}
\end{table}