\begin{table}%t2
%\centering
\par
\caption{Kolmogorov-Smirnov test results.\label{tab:ks-alp}}
\begin{tabular}{ccccc}
\hline\hline
Lens mass ($M_\odot$)&$ks_{\rm MW}$ &$ks_{\rm LMC}$ &
$ks_\alpha$ & $\alpha$\\
\hline
0.01 & 1.000 &1.000 &1.000 &0.000\\
0.10 & 0.999 &0.683 &0.683 &0.000\\
0.15 & 0.994 &0.159 &0.085 &0.095\\
0.20 & 0.984 &0.450 &0.118 &0.347\\ 
0.22 & 0.969 &0.655 &0.144 &0.471\\
0.30 & 0.877 &0.957 &0.240 &0.703\\
0.40 & 0.579 &0.997 &0.228 &0.871\\
0.50 & 0.176 &1.000 &0.176 &1.000\\
0.60 & 0.398 &1.000 &0.398 &1.000\\
0.80 & 0.743 &1.000 &0.743 &1.000\\
1.00 & 0.911 &1.000 &0.911 &1.000\\
\hline
\end{tabular}
\end{table}