\begin{table}%t4
%\centering
\par
\caption{Side lobe amplitude ratios $R_k$, phase differences $\Delta \phi_k$
(in degrees) and asymmetry
  parameters $Q$ as defined in the
  text, and their respective
  errors for the 2004 photometric $V$ data.  
$k$ denotes the multiplet order.}             % title of Table
\label{table:4}      % is used to refer this table in the text
%\centering
                          % used for centering table
\par
\begin{tabular}{c c c c c c c}        % centered columns (4 columns)
\hline
\hline               % inserts double horizontal lines
$k$ & $R_k$ & $\sigma_{R_k}$ & $\Delta \phi_k$ & $\sigma_{\Delta \phi_k}$ &
$Q$ & $\sigma_Q$ \\
\hline                        % inserts single horizontal line
1  &	5.881 &	0.324&	--12.017	&9.896	&0.709	&0.014\\
2  &	2.150 &	0.086&	--143.067&10.225	&0.365	&0.018\\
3  &	2.306 &	0.090&	--3.703&	7.231	&0.395	&0.016\\
4  &	2.987 &	0.156&	207.136&7.114	&0.498	&0.020\\
5  &	4.435 &	0.476&	--43.743&6.982	&0.632	&0.032\\
6  &	4.656 &	0.868&	--128.733&7.070	&0.646	&0.054\\
7  &	2.489 &	0.354&	--60.533&9.415	&0.427	&0.058\\
\hline                                   %inserts single line
\end{tabular}
\end{table}