\begin{table}%t7
%\centering
\par
\caption{Joint fits to EPIC-pn FF mode observations for a 
quadrupole dominated magnetic field ($\beta_{\rm d}=0.05$) with $\mu=3.87$ and $\mathcal{O}= 11^{\circ}$, 
forcing the hydrogen column density, 
the normalization constant and the magnetic field intensity to be the same for all observations.
The best fit yields $\chi^{2}=1192$ for 819 d.o.f.
\label{qfit1}}
\begin{tabular}{l|ccccc}
\hline
\hline
{Rev.} & {$n_{\rm H}$}   & {${\cal B}$}  & {$kT_{\rm pole}$} & {$R/D_{300}$} & {$B_{\rm p}$}  \\
{} & {($10^{20}$  cm$^{-2}$)}   & {} & {(eV)} & {} & {($10^{12}$ G)} \\
\hline
175 &  $\rm 1.23^{+0.04}_{-0.04}$ & $\rm 73.9^{+6.0}_{-14.1}$ & $\rm 104.6^{+0.4}_{-0.4}$  & $\rm 12.7^{+1.0}_{-2.1}$ & $\rm 18.2^{+1.6}_{-1.5}$  \\
533 &  = & $\rm 58.6^{+2.0}_{-2.4}$ & $\rm 107.5^{+0.2}_{-0.3}$  & = & =  \\
534 &  = & $\rm 57.6^{+2.0}_{-2.4}$ & $\rm 107.5^{+0.4}_{-0.3}$  & = & =  \\
815 &  = & $\rm 26.9^{+1.7}_{-0.6}$ & $\rm 118.2^{+0.5}_{-0.2}$  & = & =  \\
1086 & = & $\rm 31.8^{+0.9}_{-1.1}$ & $\rm 116.3^{+0.5}_{-0.3}$  & = & =  \\
\hline
\end{tabular}
\end{table}