\begin{table}%t5
\caption{Joint fits to EPIC-pn FF mode observations for a purely  dipolar field ($\beta_{\rm d}=1$) 
with $\mu=1.34$ and  ${\cal O}=12^\circ $, forcing the hydrogen column density, 
the normalization constant and the magnetic field intensity to be the same for all observations.
The best fit yields $\chi^{2}=1570$ for 819~d.o.f.
\label{fitdip2}}
\begin{tabular}{l|ccccc}
\hline
\hline 
{Rev.} & {$n_{\rm H}$}   & {${\cal B}$}    & {$kT_{\rm pole}$} & {$R/D_{300}$} & {$B_{\rm p}$} \\
{} & {($10^{20}$~cm$^{-2}$)}   & {}   & {(eV)} & {} & {($10^{12}$ G)} \\
\hline 
175 &  $\rm 1.33^{+0.04}_{-0.02}$ & $\rm 20.5^{+6.5}_{-10.5}$ & $\rm 120.6^{+0.2}_{-0.6}$  & $\rm 11.3^{+1.1}_{-1.8}$ & $\rm 14.1^{+0.6}_{-0.2}$  \\
533 &  = & $\rm 29.7^{+1.9}_{-2.2}$ & $\rm 123.3^{+0.3}_{-0.4}$  & = & = \\
534 &  = & $\rm 31.3^{+1.7}_{-2.4}$ & $\rm 123.5^{+0.4}_{-0.4}$  & = & = \\
815 &  = & $\rm 56.0^{+0.7}_{-0.7}$ & $\rm 132.3^{+0.5}_{-0.4}$  & = & = \\
1086 & = & $\rm 52.2^{+1.5}_{-1.5}$ & $\rm 131.2^{+0.3}_{-0.7}$  & = & = \\
\hline
\end{tabular}
\end{table}