\begin{table}%t3
%\centering
\par
\caption{Joint fits to all EPIC pn FF mode observations in the
0.18--1.2~keV band with absorbed BB plus absorption Gaussian line
model with a width of $\sigma=75$~eV.
The absorption is forced to be the same in all
observations. NC indicates that a parameter cannot be constrained
(i.e. the corresponding model  is not required by the data).
The total~$\chi^{2}$ is~902 for 811~d.o.f.
\label{0.18-1.2BBGa}}
\begin{tabular}{lccccc}
\hline
\hline
{Rev.} & {$n_{\rm H}$} & {\it KT}  & {$E_{\rm line}$} & {$-EW_{\rm line}$} & 
{$R_{\infty}/D_{300}$} \\
{} & {($10^{20} ~\rm  cm^{-2}$)}   & {(eV)} &{(eV)} & {(eV)} &  {(km/300 pc)} \\
\hline 
175 &  $\rm 1.09^{+0.10}_{-0.10}$ & $\rm 84.45^{+0.05}_{-0.03}$ & NC & NC  & $\rm 5.5^{+1.2}_{-1.0}$ \\
533 & = & $\rm 85.45^{+0.03}_{-0.05}$ & $\rm 289^{+11}_{-10}$ & $\rm 33.8^{+3.0}_{-2.8}$& $\rm 5.6^{+1.5}_{-1.4}$ \\
534 & = & $\rm 85.64^{+0.08}_{-0.04}$ & $\rm 311^{+10}_{-11}$ & $\rm 34.4^{+3.1}_{-3.0}$& $\rm 5.5^{+1.1}_{-1.3}$ \\
815 & = & $\rm 91.61^{+0.05}_{-0.04}$ & $\rm 307^{+5}_{-6}$   & $\rm 69.8^{+2.7}_{-2.8}$& $\rm 5.0^{+1.2}_{-1.1}$ \\
1086& = & $\rm 90.51^{+0.06}_{-0.03}$ & $\rm 301^{+6}_{-6}$   & $\rm 59.3^{+2.4}_{-2.3}$& $\rm 5.1^{+1.0}_{-1.2}$ \\
\hline 
\end{tabular}
\end{table}