\begin{table}%t3
\caption{\label{tab3}Elemental abundance and isotopic ratio measurements for three 
 CEMP stars.}
 \small%\centering
\par
\begin{tabular}{lrrrrrrr}
\hline\hline
Element &  \multicolumn{2}{c}{\csthree} & 
\multicolumn{2}{c}{\cstwo}&\multicolumn{2}{c} {CS~29528-041}&  Sun \\
 &  \multicolumn{1}{c}{log($\epsilon$)} & \multicolumn{1}{c}{[X/Fe]} 
        &  \multicolumn{1}{c}{log($\epsilon$)} & \multicolumn{1}{c}{[X/Fe]} 
        &  \multicolumn{1}{c}{log($\epsilon$)} & \multicolumn{1}{c}{[X/Fe]} 
        &  log($\epsilon$) \\
\hline
Li      & 1.73~$\pm$~0.05     & \nodata         &  $<$0.6            & \nodata           
& 1.71~$\pm$~0.05  & \nodata          & 1.10 \\
C(CH)   & 8.25~$\pm$~0.01     & +2.69 ~$\pm$~0.14 &  8.70~$\pm$~0.01     & 
+3.15~$\pm$~0.12    & 6.70~$\pm$~0.08  & +1.59~$\pm$~0.15   & 8.41 \\
C(C2)   & 8.35~$\pm$~0.01     & +2.79 ~$\pm$~0.14 &  8.70~$\pm$~0.01     & 
+3.15~$\pm$~0.12    &\nodata         & \nodata          & 8.41 \\
N(NH)   &                   & \nodata         &  7.05~$\pm$~0.02     & 
+2.10~$\pm$~0.12    & 7.50~$\pm$~0.1   & +3.00~$\pm$~0.15   & 7.80 \\
N(CN)   & 5.65~$\pm$~0.01     & +0.70 ~$\pm$~0.11 &  7.10~$\pm$~0.01     & 
+2.15~$\pm$~0.11    & 7.57~$\pm$~0.06  & +3.07~$\pm$~0.13   & 7.80 \\
O(LTE)  & 8.17~$\pm$~0.05     & +2.35 ~$\pm$~0.12 &  7.17~$\pm$~0.05     & 
+1.35~$\pm$~0.11    & $<$6.77        &$<$+1.40~$\pm$~0.10 & 8.67 \\ 
O(NLTE) & 8.05~$\pm$~0.05     & +2.23 ~$\pm$~0.12 &  6.94~$\pm$~0.05     & 
+1.12~$\pm$~0.11    & $<$6.77        &$<$+1.40~$\pm$~0.10 & 8.67 \\
Na(LTE) & 3.20~$\pm$~0.05     & $-$0.28~$\pm$~0.12&  6.30~$\pm$~0.10     & 
+2.82~$\pm$~0.15    & 4.23~$\pm$~0.05  & +1.20~$\pm$~0.11   & 6.33 \\
Na(NLTE)& 3.00~$\pm$~0.05     & $-$0.48~$\pm$~0.12&  6.10~$\pm$~0.10     & 
+2.62~$\pm$~0.15    & 4.02~$\pm$~0.05  & +1.00~$\pm$~0.11   & 6.33 \\
Mg I    & 5.38              & +0.65 ~$\pm$~0.12 &  5.05~$\pm$~0.04     & 
+0.32~$\pm$~0.15    & 4.68~$\pm$~0.01  & +0.40~$\pm$~0.11   & 7.58 \\
Al(LTE) & 2.67              & $-$0.95~$\pm$~0.11&  2.77              & $-
$0.85~$\pm$~0.10  & 2.77           & $-$0.85~$\pm$~0.10 & 6.47 \\
Al(NLTE)& 3.32              & $-$0.30~$\pm$~0.11&  3.32              & $-
$0.20~$\pm$~0.10  & 3.32           & $-$0.20~$\pm$~0.10 & 6.47 \\
Si I    & 4.75              & +0.05 ~$\pm$~0.15 &  4.85              & 
+0.15~$\pm$~0.10    & 4.05           & $-$0.20~$\pm$~0.10 & 7.55 \\
Ca I    & 3.68~$\pm$~0.05     & +0.17 ~$\pm$~0.13 &  3.87~$\pm$~0.06     & 
+0.36~$\pm$~0.15    & 3.46~$\pm$~0.03  & +0.40~$\pm$~0.15   & 6.36 \\
Sc II   & 0.30~$\pm$~0.05     & $-$0.02~$\pm$~0.14&  0.37~$\pm$~0.05     & 
+0.05~$\pm$~0.11    & 0.13~$\pm$~0.03  & +0.26~$\pm$~0.15   & 3.17 \\
Ti I    & 2.59~$\pm$~0.03     & +0.42 ~$\pm$~0.16 &  2.60              & 
+0.43~$\pm$~0.10    & 2.32~$\pm$~0.04  & +0.40~$\pm$~0.15   & 5.02 \\
Ti II   & 2.39~$\pm$~0.01     & +0.22 ~$\pm$~0.11 &  2.36~$\pm$~0.07     & 
+0.19~$\pm$~0.14    & 2.12~$\pm$~0.007 & +0.40~$\pm$~0.10   & 5.02 \\
V  I    & 1.15~$\pm$~0.05     & +0.00 ~$\pm$~0.12 &  1.10              & $-
$0.05~$\pm$~0.10  & 0.70           & +0.00~$\pm$~0.15   & 4.00 \\
Cr I    & 2.84~$\pm$~0.03     & +0.02 ~$\pm$~0.12 &  2.67~$\pm$~0.04     & $-
$0.15~$\pm$~0.11  & 2.20~$\pm$~0.01  &$-$0.17~$\pm$~0.11  & 5.67 \\
Mn I    & 2.33~$\pm$~0.05     & $-$0.21~$\pm$~0.13&  2.33~$\pm$~0.05     & $-
$0.21~$\pm$~0.14  & 1.59~$\pm$~0.07  &$-$0.50~$\pm$~0.15  & 5.39 \\
Fe I    & 4.65~$\pm$~0.003    & $-$0.00~$\pm$~0.10&  4.65~$\pm$~0.04     & 
+0.00~$\pm$~0.10    & 4.20~$\pm$~0.002 &+0.00~$\pm$~0.10    & 7.50 \\
Fe II   & 4.66~$\pm$~0.02     & $-$0.05~$\pm$~0.11&  4.57~$\pm$~0.09     & $-
$0.08~$\pm$~0.12  & 4.20~$\pm$~0.02  &+0.00~$\pm$~0.10    & 7.50 \\
Co I    & 2.38~$\pm$~0.03     & +0.31 ~$\pm$~0.11 &  2.27~$\pm$~0.14     & 
+0.20~$\pm$~0.18    & 1.62~$\pm$~0.04  &+0.00~$\pm$~0.15    & 4.92 \\
Ni I    & 3.49~$\pm$~0.03     & +0.09 ~$\pm$~0.16 &  3.31~$\pm$~0.10     & $-
$0.09~$\pm$~0.16  & 2.95~$\pm$~0.01  &+0.00~$\pm$~0.12    & 6.25 \\
Zn I    & 2.33~$\pm$~0.08     & +0.58 ~$\pm$~0.15 &  \nodata           &\nodata            
& \nodata        & \nodata  & 4.60\\
Sr II   & $-$0.29~$\pm$~0.05  & $-$0.41~$\pm$~0.12&  $-$0.53           & $-
$0.20~$\pm$~0.11  &$-$0.53         & $-$0.20~$\pm$~0.10 & 2.97 \\
Y  II   & $-$0.96~$\pm$~0.05  & $-$0.35~$\pm$~0.13&  \nodata           & \nodata           
&\nodata         &\nodata  & 2.24 \\
Ba II   & 0.05~$\pm$~0.05     & +0.77  ~$\pm$~0.15&  $<$$-$1.40        & $<$$-
$0.53~$\pm$~0.16  &$-$0.23      & +0.97~$\pm$~0.10   & 2.13 \\
$^{12}$C/$^{13}$C & $>$40  &         &  9.0~$\pm$~2.0       & \nodata  &\nodata         
&\nodata         &\nodata    \\
\hline
\end{tabular}
\end{table}