\begin{table}%t2
%\centering
\par
\caption{\label{elecnuGem}Line parameters for $\nu$~Gem: Next to the
  heights (in continuum units) of the $V$ and $R$~emission peaks the
  one of the central peak is given, when a triple-peaked profile was
  present (C peak). The radial velocities  correspond to the local
  minima (modes) in these lines (for H$\alpha$ of the central
  depression). The typical error is 11 and 3~km~s~$^{-1}$ for the
  \ion{He}{i}~6678 measurements in the Ond{\v r}ejov coud\'e and 
  H{\sc   eros} data, respectively, and about 1 and 0.2~km~s~$^{-1}$ for
  the much sharper H$\alpha$ absorption core.  The full table and
  similar tables for other stars are published electronically only.}
%
\begin{tabular}{rcccccrrr}\hline\hline
\multicolumn{1}{c}{JD} & $V$ peak & $R$ peak& $V/R$ & peak
sep. & C peak & $v_{\rm H\alpha}$ & $v_{\ion{He}{i}~6678}$ &
$v_{\ion{Si}{ii}~6347}$ \\
%
HJD-2~400~000 & [$I_{\rm violet}/I_{\rm cont}$] & [$I_{\rm red}/I_{\rm
  cont}$] & & [km~s~$^{-1}$] & [$I_{\rm cent}/I_{\rm cont}$] &
  [km~s~$^{-1}]$ & [km~s~$^{-1}$] & [km~s~$^{-1}$] \smallskip \\
% 
\hline
49~658.692 & 1.43  & 1.41  & 1.02  & 173.4 & ---   & 24.6 & 47.9 & 45.0 \\
49~661.640 & 1.42  & 1.38  & 1.03  & 174.5 & ---   & 25.8 & 61.5 & 47.6 \\
49~662.656 & 1.44  & 1.39  & 1.04  & 186.9 & ---   & 26.9 & 62.8 & 51.2 \\ 
49~679.699 & 1.43  & 1.40  & 1.02  & 179.7 & ---   & 26.4 & 31.0 & 38.8 \\    
50~015.671 & 1.51  & 1.31  & 1.15  & 203.4 & ---   & 20.4 & --2.5& 17.3 \\
%
\multicolumn{1}{c}{$\vdots$} & $\vdots$ & $\vdots$ & $\vdots$ &
$\vdots$& $\vdots$ &\multicolumn{1}{r}{$\vdots$~~~}
&\multicolumn{1}{r}{$\vdots$~~~} &\multicolumn{1}{r}{$\vdots$~~~}\\
%
\hline
\end{tabular}                  
\par
\end{table}