\begin{table}
\caption{\label{table1a}CCD photometry in M92C.}
\begin{tabular}{r|rr|ccccc|r}
\hline\hline
 Nr  &  Xc  &  Yc &   $V$   &  $Y-V$  & $ P-V$  &  $X-V$ &  $V-S$  & $B-V$ \\  \hline
   1 & 1235 &  740&  11.76&   0.45&  1.62 &  1.11&   0.39& 0.45\\
   2 &  907 &  750&  12.25&   1.00&  3.19 &  2.33&   0.90& 1.34\\
   3 & 1056 &  995&  12.33&   0.90&  2.43 &  1.89&   0.55& 1.07\\
   4 & 1114 & 1028&  12.34&   0.99&  3.10 &  2.28&   0.87& 1.31\\
   5 &  957 & 1360&  12.35&   0.97&  2.98 &  2.20&   0.88& 1.26\\
   6 &  970 & 1007&  12.40&   1.04&  3.78 &  2.42&   0.92& 1.40\\
   7 & 1223 &  940&  12.49&   0.96&  2.99 &  2.21&   0.88& 1.26\\
   8 & 1000 & 1187&  12.50&   0.98&  3.02 &  2.22&   0.88& 1.27\\
   9 &  902 & 1211&  12.51&   0.94&  3.01 &  2.20&   0.88& 1.24\\
  10 &  895 & 1065&  12.54&   0.88&  2.84 &  2.09&   1.03& 1.16\\
  11 & 1261 & 1172&  12.58&   0.94&  2.90 &  2.16&   0.87& 1.22\\
  12 & 1149 &  929&  12.60&   0.89&  2.77 &  2.05&   0.83& 1.14\\
  13 &  987 &  919&  12.70&   0.91&  3.01 &  2.18&   0.94& 1.22\\
  14 &  784 &  655&  12.88&   0.87&  2.67 &  1.98&   0.78& 1.10\\
  15 & 1124 &  827&  12.90&   0.86&  2.63 &  1.98&   0.80& 1.09\\
  16 & 1090 &  766&  12.92&   0.66&  2.57 &  1.83&   0.68& 0.92\\
  17 &  868 &  830&  12.97&   0.86&  2.63 &  1.96&   0.80& 1.08\\
  18 & 1020 & 1178&  13.10&   0.88&  2.60 &  1.96&   0.76& 1.09\\
  19 & 1050 & 1265&  13.11&   0.83&  2.53 &  1.87&   0.79& 1.02\\
  20 &  735 & 1060&  13.34&   0.81&  2.41 &  1.82&   0.76& 0.99\\
  21 & 1005 & 1317&  13.34&   0.81&  2.47 &  1.85&   0.77& 1.00\\
  22 &  727 &  973&  13.44&   0.77&  2.30 &  1.74&   0.74& 0.93\\
  23 & 1154 & 1279&  13.47&   0.80&  2.39 &  1.77&   0.76& 0.96\\
  24 &  903 & 1161&  13.49&   0.75&  2.25 &  1.70&   0.74& 0.90\\
  25 & 1004 & 1266&  13.65&   0.82&  2.32 &  1.80&   0.70& 0.98\\
  26 &  925 &  967&  13.70&   0.79&  2.31 &  1.75&   0.76& 0.94\\
  27 &  713 &  653&  13.79&   0.74&  2.22 &  1.66&   0.71& 0.87\\
  28 & 1085 & 1004&  13.82&   0.56&  2.41 &  1.36&   0.89& 0.63\\
  29 &  796 & 1180&  13.82&   0.70&  2.03 &  1.55&   0.68& 0.80\\
  30 & 1097 &  811&  13.83&   0.74&  2.33 &  1.73&   0.76& 0.91\\
  31 &  967 &  888&  13.84&   0.79&  2.29 &  1.76&   0.73& 0.95\\
  32 & 1164 & 1434&  13.86&   0.72&  2.13 &  1.59&   0.70& 0.83\\
  33 & 1160 &  693&  13.87&   0.74&  2.25 &  1.64&   0.74& 0.86\\
  34 & 1336 &  852&  13.88&   0.71&  2.09 &  1.52&   0.68& 0.79\\
  35 & 1022 &  858&  13.88&   0.72&  2.06 &  1.56&   0.62& 0.81\\
  36 & 1039 & 1208&  13.94&   0.70&  2.01 &  1.51&   0.63& 0.78\\
  37 & 1248 &  572&  13.98&   0.73&  2.25 &  1.59&   0.69& 0.83\\
  38 & 1025 & 1188&  13.98&   0.71&  2.26 &  1.68&   0.80& 0.87\\
  39 & 1060 & 1139&  13.99&   0.69&  2.06 &  1.55&   0.67& 0.79\\
  40 &  704 &  986&  13.99&   0.74&  2.19 &  1.66&   0.72& 0.87\\
  41 & 1123 &  976&  14.01&   0.69&  2.02 &  1.49&   0.64& 0.76\\
  42 & 1276 &  936&  14.03&   0.80&  1.92 &  1.43&   0.59& 0.79\\
  43 & 1261 &  677&  14.07&   0.73&  2.21 &  1.60&   0.70& 0.84\\
  44 &  747 &  945&  14.07&   0.73&  2.19 &  1.67&   0.70& 0.87\\
  45 &  848 & 1300&  14.09&   0.70&  2.06 &  1.56&   0.69& 0.80\\
  46 & 1003 &  909&  14.09&   0.71&  2.19 &  1.61&   0.79& 0.83\\
  47 &  927 & 1065&  14.10&   0.59&  1.87 &  1.49&   0.68& 0.71\\
  48 & 1171 & 1177&  14.10&   0.74&  2.22 &  1.67&   0.71& 0.88\\
  49 & 1367 &  770&  14.10&   0.69&  2.06 &  1.48&   0.66& 0.76\\
  50 &  802 &  879&  14.11&   0.74&  2.18 &  1.66&   0.68& 0.87\\
  51 & 1030 &  859&  14.14&   0.69&  2.04 &  1.51&   0.71& 0.77\\
  52 &  966 & 1136&  14.15&   0.87&  2.11 &  1.71&   0.25& 0.96\\ 
  53 & 754 &1287 &  14.16&   0.74&  2.17 &  1.61&   0.63& 0.85\\
  54 &1037 & 789 &  14.19&   0.73&  2.17 &  1.64&   0.71& 0.86\\
  55 &1350 & 864 &  14.19&   0.73&  2.13 &  1.62&   0.70& 0.85\\
  56 &1051 & 756 &  14.21&   0.73&  2.10 &  1.59&   0.69& 0.83\\
  57 &1405 &1035 &  14.24&   0.52&  1.77 &  1.23&   0.49& 0.55\\
  58 & 938 &1098 &  14.30&   0.75&  2.22 &  1.59&   0.68& 0.84\\
  59 &1084 & 901 &  14.32&   0.65&  2.14 &  1.57&   0.83& 0.78\\
  60 & 727 &1352 &  14.34&   0.70&  2.14 &  1.62&   0.69& 0.83\\
  61 & 935 & 789 &  14.36&   0.63&  1.94 &  1.40&   0.66& 0.69\\
  62 & 993 &1342 &  14.37&   0.63&  1.82 &  1.34&   0.60& 0.66\\
  63 &1173 &1046 &  14.38&   0.64&  1.88 &  1.38&   0.60& 0.68\\
  64 & 711 & 890 &  14.44&   0.64&  1.85 &  1.41&   0.63& 0.70\\
  65 &1242 &1291 &  14.46&   0.67&  1.90 &  1.39&   0.65& 0.70\\
  66 & 847 & 811 &  14.47&   0.67&  2.55 &  1.82&   0.67& 0.92\\
  67 &1499 & 954 &  14.47&   0.70&  1.98 &  1.52&   0.68& 0.78\\
  68 &1180 & 847 &  14.47&   0.63&  1.76 &  1.34&   0.57& 0.66\\
  69 &1178 & 869 &  14.49&   0.69&  2.08 &  1.59&   0.71& 0.81\\
  70 & 738 & 808 &  14.50&   0.61&  1.77 &  1.34&   0.58& 0.65\\
  71 & 633 &1427 &  14.52&   0.47&  1.64 &  0.97&   0.15& 0.39\\
  72 &1016 &1194 &  14.53&   0.59&  1.70 &  1.22&   0.62& 0.58\\
  73 & 726 & 814 &  14.54&   0.65&  1.84 &  1.41&   0.64& 0.70\\
  74 & 719 &1465 &  14.55&   0.70&  2.08 &  1.55&   0.67& 0.80\\
  75 &1240 & 938 &  14.58&   0.71&  2.08 &  1.55&   0.68& 0.80\\
  76 &1064 & 946 &  14.59&   0.52&  1.66 &  1.25&   0.74& 0.56\\
  77 & 851 & 670 &  14.61&   0.70&  2.04 &  1.51&   0.65& 0.78\\
  78 & 566 &1487 &  14.62&   0.69&  2.01 &  1.52&   0.62& 0.78\\
  79 &1251 & 648 &  14.63&   0.68&  2.02 &  1.55&   0.67& 0.79\\
  80 & 801 & 754 &  14.63&   0.70&  2.01 &  1.55&   0.67& 0.80\\
  81 & 783 &1177 &  14.66&   0.69&  1.96 &  1.55&   0.67& 0.79\\
  82 &1107 & 852 &  14.66&   0.70&  2.05 &  1.60&   0.64& 0.82\\
  83 & 958 &1093 &  14.67&   0.63&  1.68 &  1.16&   0.25& 0.57\\
  84 & 951 &1231 &  14.69&   0.23&  1.28 &  0.60&   0.11& 0.09\\
  85 &1137 & 853 &  14.70&   0.58&  1.71 &  1.22&   0.53& 0.57\\
  86 &1417 & 812 &  14.72&   0.70&  2.08 &  1.54&   0.67& 0.79\\
  87 &1247 & 806 &  14.72&   0.71&  2.06 &  1.56&   0.64& 0.81\\
  88 & 902 &1054 &  14.72&   0.78&  1.94 &  1.44&   0.57& 0.78\\
  89 &1511 & 588 &  14.73&   0.68&  2.02 &  1.47&   0.64& 0.75\\
  90 & 953 &1096 &  14.74&   0.77&  2.13 &  1.48&   0.41& 0.80\\
  91 &1181 & 913 &  14.74&   0.70&  2.05 &  1.56&   0.72& 0.80\\
  92 &1049 & 922 &  14.76&   0.63&  2.04 &  1.49&   0.78& 0.73\\
  93 &1083 & 869 &  14.77&   0.69&  2.13 &  1.69&   0.66& 0.86\\
  94 & 581 &1240 &  14.78&   0.67&  2.03 &  1.49&   0.65& 0.75\\
  95 &1163 &1137 &  14.79&   0.57&  1.78 &  1.18&   0.38& 0.55\\
  96 & 681 & 637 &  14.81&   0.54&  1.62 &  1.13&   0.51& 0.51\\
  97 & 940 & 877 &  14.81&   0.67&  1.94 &  1.50&   0.65& 0.76\\
  98 &1188 &1052 &  14.85&   0.65&  1.94 &  1.56&   0.77& 0.78\\
  99 & 724 &1039 &  14.86&   0.67&  2.01 &  1.50&   0.66& 0.76\\
 100 & 705 &1104 &  14.87&   0.67&  1.95 &  1.48&   0.68& 0.75\\
 101 & 574 & 888 &  14.88&   0.68&  1.92 &  1.49&   0.60& 0.76\\
 102 & 916 & 937 &  14.95&   0.68&  1.99 &  1.55&   0.68& 0.79\\
 103 & 776 & 954 &  14.97&   0.25&  1.04 &  0.50&   0.03& 0.05\\
 104 &1170 & 967 &  14.97&   0.70&  2.07 &  1.58&   0.71& 0.81\\
 105 & 864 &1101 &  14.98&   0.47&  1.71 &  1.01&   0.32& 0.41\\
 106 & 814 &1368 &  15.04&   0.24&  1.38 &  0.65&   0.15& 0.12\\
107 & 1093 &  1039&  15.05&   0.53&  1.68 &  1.40&   0.94& 0.64\\
 108 &  555 &   804&  15.10&   0.31&  1.42 &  0.72&   0.21& 0.19\\
 109 &  994 &   812&  15.10&   0.29&  1.40 &  0.71&   0.14& 0.17\\
 110 & 1154 &  1059&  15.13&   0.40&  1.56 &  0.79&   0.05& 0.27\\
 111 & 1409 &  1184&  15.16&   0.31&  1.28 &  0.60&   0.10& 0.13\\
 112 & 1402 &   828&  15.17&   0.67&  2.00 &  1.46&   0.65& 0.74\\
 113 &  922 &   721&  15.17&   0.66&  1.81 &  1.43&   0.62& 0.72\\
 114 & 1165 &  1290&  15.18&   0.33&  1.40 &  0.77&   0.28& 0.22\\
 115 & 1006 &   610&  15.18&   0.28&  1.40 &  0.69&   0.23& 0.16\\
 116 & 1354 &  1126&  15.19&   0.32&  1.46 &  0.76&   0.28& 0.21\\
 117 &  940 &  1252&  15.20&   0.67&  2.01 &  1.51&   0.66& 0.76\\
 118 &  905 &   807&  15.21&   0.66&  1.96 &  1.39&   0.62& 0.70\\
 119 &  902 &   972&  15.21&   0.32&  1.38 &  0.75&   0.13& 0.21\\
 120 & 1180 &  1100&  15.21&   0.74&  1.99 &  1.59&   0.55& 0.84\\
 121 & 1154 &  1000&  15.21&   0.44&  1.38 &  0.76&   0.10& 0.27\\
 122 &  952 &  1150&  15.22&   0.68&  1.94 &  1.53&   0.64& 0.78\\
 123 &  729 &   923&  15.22&   0.31&  1.32 &  0.77&   0.26& 0.21\\
 124 & 1035 &  1501&  15.23&   0.26&  1.30 &  0.64&   0.25& 0.12\\
 125 &  864 &   932&  15.23&   0.59&  1.74 &  1.19&   0.44& 0.56\\
 126 &  968 &   923&  15.23&   0.71&  1.94 &  1.45&   0.69& 0.75\\
 127 & 1410 &  1263&  15.24&   0.68&  1.83 &  1.43&   0.67& 0.73\\
 128 & 1046 &  1309&  15.25&   0.66&  1.91 &  1.44&   0.67& 0.72\\
 129 &  600 &  1106&  15.25&   0.25&  1.32 &  0.65&   0.14& 0.12\\
 130 &  911 &   932&  15.25&   0.67&  1.95 &  1.50&   0.63& 0.76\\
 131 &  732 &  1160&  15.26&   0.24&  1.38 &  0.67&   0.24& 0.13\\
 132 &  579 &  1011&  15.28&   0.27&  1.33 &  0.64&   0.14& 0.13\\
 133 &  883 &   907&  15.28&   0.16&  1.13 &  0.56&   0.29& 0.03\\
 134 & 1334 &   739&  15.28&   0.29&  1.31 &  0.59&   0.10& 0.11\\
 135 & 1111 &  1048&  15.29&   0.47&  1.74 &  0.94&   0.26& 0.38\\
 136 &  562 &   824&  15.29&   0.23&  1.32 &  0.60&   0.16& 0.09\\
 137 &  959 &   849&  15.30&   0.20&  1.12 &  0.59&   0.47& 0.07\\
 138 & 1452 &   667&  15.30&   0.65&  1.90 &  1.38&   0.64& 0.69\\
 139 & 1165 &   903&  15.32&   0.25&  1.37 &  0.61&   0.16& 0.10\\
 140 &  770 &  1050&  15.33&   0.66&  1.93 &  1.51&   0.66& 0.76\\
 141 & 1124 &  1368&  15.33&   0.30&  1.37 &  0.67&   0.14& 0.16\\
 142 & 1081 &   756&  15.33&   0.25&  1.32 &  0.62&   0.13& 0.11\\
 143 &  930 &  1039&  15.34&   0.57&  1.90 &  1.45&   0.87& 0.68\\
 144 &  940 &   770&  15.34&   0.21&  1.52 &  0.59&   0.25& 0.07\\
 145 &  781 &  1112&  15.35&   0.50&  1.52 &  1.07&   0.57& 0.46\\
 146 & 1171 &   944&  15.36&   0.67&  1.96 &  1.47&   0.65& 0.74\\
 147 & 1439 &   596&  15.37&   0.29&  1.41 &  0.55&   0.13& 0.09\\
 148 & 1031 &   917&  15.38&   0.25&  1.45 &  0.67&   0.18& 0.13\\
 149 & 1076 &   762&  15.39&   0.30&  1.42 &  0.68&   0.12& 0.16\\
 150 &  826 &  1018&  15.39&   0.65&  1.80 &  1.44&   0.68& 0.72\\
 151 &  925 &  1505&  15.40&   0.47&  1.54 &  1.02&   0.45& 0.42\\
 152 & 1214 &  1100&  15.40&   0.31&  1.35 &  0.62&   0.00& 0.14\\
 153 &  991 &   877&  15.40&   0.26&  1.45 &  0.70&   0.27& 0.15\\
 154 & 1482 &   965&  15.42&   0.30&  1.40 &  0.63&   0.14& 0.14\\
 155 &  561 &  1098&  15.42&   0.66&  1.95 &  1.40&   0.65& 0.70\\
 156 & 1227 &   917&  15.43&   0.27&  1.49 &  0.69&   0.18& 0.15\\
 157 & 1027 &   800&  15.43&   0.28&  1.28 &  0.64&   0.13& 0.13\\
 158 & 1013 &   628&  15.44&   0.29&  1.35 &  0.61&   0.13& 0.12\\
 159 &  912 &  1367&  15.46&   0.62&  1.80 &  1.48&   0.66& 0.72\\
 160 & 1129 &   946&  15.48&   0.69&  2.01 &  1.43&   0.60& 0.73\\
 161 & 1071 &   817&  15.48&   0.18&  1.35 &  0.57&   0.24& 0.05\\
 162 &  1266 &  1012&  15.48&   0.19&  1.36 &  0.53&   0.13& 0.03\\
 163 &   971 &   646&  15.51&   0.31&  1.33 &  0.64&   0.09& 0.15\\
 164 &   854 &  1402&  15.51&   0.65&  1.76 &  1.33&   0.59& 0.66\\
 165 &   865 &  1073&  15.52&   0.20&  1.17 &  0.50&   0.14& 0.02\\
 166 &   885 &   837&  15.52&   0.66&  1.77 &  1.40&   0.58& 0.70\\
 167 &   831 &  1027&  15.54&   0.52&  1.71 &  1.34&   0.50& 0.60\\
 168 &  1008 &  1395&  15.56&   0.65&  1.94 &  1.43&   0.66& 0.71\\
 169 &  1043 &   855&  15.59&   0.24&  1.40 &  0.49&   0.33& 0.04\\
 170 &   895 &   584&  15.61&   0.61&  1.78 &  1.41&   0.65& 0.68\\
 171 &   847 &   732&  15.63&   0.67&  1.88 &  1.43&   0.66& 0.72\\
 172 &  1070 &  1211&  15.63&   0.62&  1.93 &  1.49&   0.67& 0.73\\
 173 &   919 &   762&  15.64&   0.17&  1.19 &  0.51&   0.19& 0.01\\
 174 &  1146 &   804&  15.64&   0.69&  1.90 &  1.38&   0.56& 0.71\\
 175 &  1094 &   836&  15.65&   0.27&  1.51 &  0.59&   0.19& 0.10\\
 176 &  1326 &  1044&  15.65&   0.61&  1.86 &  1.35&   0.74& 0.65\\
 177 &   758 &  1200&  15.66&   0.64&  2.04 &  1.53&   0.69& 0.76\\
 178 &   932 &   823&  15.66&   0.22&  1.25 &  0.56&   0.11& 0.06\\
 179 &   868 &   802&  15.68&   0.67&  1.89 &  1.39&   0.65& 0.70\\
 180 &   650 &   920&  15.70&   0.34&  1.27 &  0.67&   0.09& 0.18\\
 181 &   938 &  1147&  15.70&   0.65&  1.90 &  1.23&   0.65& 0.61\\
 182 &  1201 &   978&  15.71&   0.24&  1.24 &  0.50&   0.13& 0.04\\
 183 &  1313 &  1199&  15.71&   0.66&  1.80 &  1.32&   0.69& 0.66\\
 184 &   842 &  1028&  15.72&   0.74&  1.82 &  1.44&   0.52& 0.76\\
 185 &   955 &   794&  15.73&   0.35&  1.45 &  0.64&   0.05& 0.17\\
 186 &   789 &  1421&  15.75&   0.63&  1.72 &  1.34&   0.67& 0.66\\
 187 &   628 &  1208&  15.77&   0.63&  1.71 &  1.33&   0.64& 0.65\\
 188 &   791 &   668&  15.77&   0.61&  2.24 &  1.51&   0.55& 0.73\\
 189 &   878 &  1355&  15.78&   0.39&  1.15 &  0.65&   0.07& 0.19\\
 190 &  1184 &   929&  15.78&   0.30&  1.41 &  0.63&   0.08& 0.14\\
 191 &  1195 &   930&  15.80&   0.24&  1.14 &  0.58&   0.18& 0.08\\
 192 &   817 &   610&  15.81&   0.61&  1.70 &  1.32&   0.57& 0.64\\
 193 &   807 &   994&  15.83&   0.58&  1.84 &  1.32&   0.71& 0.62\\
 194 &  1484 &   839&  15.84&   0.35&  1.23 &  0.56&   0.08& 0.13\\
 195 &   972 &   692&  15.85&   0.32&  1.19 &  0.61&   0.11& 0.14\\
 196 &   793 &  1134&  15.86&   0.22&  1.13 &  0.50&   0.17& 0.03\\
 197 &   887 &   926&  15.87&   0.59&  1.94 &  1.47&   0.75& 0.70\\
 198 &   920 &  1196&  15.87&   0.30&  1.26 &  0.62&   0.12& 0.13\\
 199 &   925 &  1228&  15.90&   0.67&  1.93 &  1.48&   0.63& 0.75\\
 200 &   738 &   722&  15.90&   0.40&  1.29 &  0.67&   0.08& 0.21\\
 201 &  1137 &   712&  15.94&   0.30&  0.96 &  0.51&   0.11& 0.08\\
 202 &   573 &   626&  15.97&   0.45&  1.16 &  0.69&   0.06& 0.24\\
 203 &  1120 &   947&  15.97&   0.64&  1.68 &  1.43&   0.72& 0.71\\
 204 &  1348 &   934&  15.98&   0.64&  1.86 &  1.32&   0.67& 0.65\\
 205 &   582 &   949&  16.01&   0.28&  1.01 &  0.57&   0.15& 0.10\\
 206 &  1328 &  1025&  16.02&   0.24&  0.98 &  0.54&   0.13& 0.06\\
 207 &   835 &   798&  16.02&   0.66&  1.73 &  1.29&   0.60& 0.65\\
 208 &  1170 &  1144&  16.03&   0.22&  1.10 &  0.51&   0.17& 0.04\\
 209 &   895 &  1390&  16.04&   0.62&  1.88 &  1.37&   0.67& 0.67\\
 210 &  1121 &   867&  16.08&   0.61&  2.10 &  1.43&   0.82& 0.69\\
 211 &   774 &   855&  16.09&   0.20&  0.96 &  0.52&   0.11& 0.03\\
 212 &  1291 &   994&  16.14&   0.20&  0.87 &  0.44&   0.26& 0.00\\
 213 &  1228 &  1011&  16.16&   0.48&  1.48 &  1.04&   0.69& 0.43\\
 214 &  1307 &   726&  16.16&   0.28&  1.11 &  0.55&   0.18& 0.09\\
 215 &  1306 &   847&  16.17&   0.67&  1.93 &  1.39&   0.65& 0.70\\
 216 &  1188 &   872&  16.17&   0.58&  1.71 &  1.38&   0.83& 0.65\\
 217 &   859 &  1067&  16.20&   0.19&  0.76 &  0.46&   0.17& 0.00\\
 218 &  1428 &   590&  16.22&   0.32&  1.07 &  0.52&   0.16& 0.09\\
 219 &   828 &  1483&  16.23&   0.40&  1.07 &  0.64&   0.17& 0.19\\
 220 &  1130 &  1013&  16.26&   0.62&  1.89 &  1.35&   0.85& 0.66\\
 221 &   898 &   886&  16.33&   0.32&  0.99 &  0.63&   0.14& 0.15\\
 222 &  1197 &   991&  16.39&   0.28&  0.96 &  0.50&   0.18& 0.06\\
 223 &   787 &  1097&  16.42&   0.33&  0.93 &  0.57&   0.06& 0.12\\
 224 &   739 &   899&  16.43&   0.37&  0.93 &  0.62&   0.03& 0.17\\
 225 &   749 &   701&  16.44&   0.30&  0.89 &  0.47&   0.11& 0.06\\
 226 &   857 &  1033&  16.48&   0.25&  1.11 &  0.52&   0.35& 0.06\\
 227 &   858 &   853&  16.53&   0.33&  0.95 &  0.54&   0.19& 0.11\\
 228 &  1258 &   806&  16.58&   0.30&  0.85 &  0.59&   0.10& 0.12\\
 229 &  1141 &  1142&  16.72&   0.16&  0.78 &  0.38&   0.41& --0.10\\
 230 &  1052 &  1242&  16.83&   0.45&  1.00 &  0.67&   0.15& 0.23\\
 \hline
 \end{tabular}  
\end{table}