\begin{table}%t3
%\centering
\par
\caption{Definition of the pseudo-equivalent width indices for the
H$\delta$ (H$\delta_{\rm A}$ in Worthey $\&$ Ottavianni \cite{Worthey97}) and for the
two high order Balmer absorption lines. For the two last lines,
we followed the same principle as for Lick indices while using
windows defined Bica $\&$ Alloin (\cite{Bica86}).
%The last line
%gives the definition of the blue and red continua which ratio is used
%to compute the 4000~\AA break value.
\label{TAB:indices}}
\begin{tabular}{ccc}
\hline\hline
\noalign{\smallskip}
Name& Blue and red bandpasses (\AA)& Index continua (\AA)\\
\hline
H$\delta_{\rm A}$    &4041.60-4079.75      4128.50-4161.00     &4083.50-4122.25  \\
H9           &3810-3820      3855-3865     &3825-3845 \\
H8           &3855-3865      3905-3915     &3870-3900 \\
\hline
\end{tabular}
\end{table}