\begin{table}%t1
\caption{\label{mesures}Radial-velocity measurements of HD~185269 obtained with ELODIE from
  June 2005 to June 2006. }
  \small%\centering
\par
\begin{tabular}{lll}
\hline\hline
JD-2~400~000. & $VR$ & error \\
day      & km~s$^{-1}$ & ms$^{-1}$ \\
\hline
 53551.55350 &    0.535 &  0.011\\
 53552.57440 &    0.639 &  0.013\\
 53553.54090 &    0.697 &  0.012\\
 53554.55910 &    0.690 &  0.008\\
 53555.54490 &    0.663 &  0.009\\
 53574.55610 &    0.687 &  0.012\\
 53576.51360 &    0.631 &  0.011\\
 53577.53300 &    0.532 &  0.010\\
 53587.46980 &    0.672 &  0.011\\
 53588.45620 &    0.677 &  0.009\\
 53589.46500 &    0.606 &  0.012\\
 53590.45090 &    0.631 &  0.014\\
 53591.48810 &    0.530 &  0.011\\
 53592.41560 &    0.543 &  0.011\\
 53594.47180 &    0.672 &  0.010\\
 53596.43110 &    0.677 &  0.010\\
 53610.43430 &    0.652 &  0.010\\
 53613.41040 &    0.593 &  0.008\\
 53624.43320 &    0.630 &  0.008\\
 53625.37140 &    0.551 &  0.010\\
 53626.37360 &    0.508 &  0.008\\
 53627.36100 &    0.597 &  0.008\\
 53628.32940 &    0.672 &  0.008\\
 53667.33630 &    0.502 &  0.008\\
 53720.25140 &    0.617 &  0.010\\
 53723.22240 &    0.603 &  0.011\\
 53808.68270 &    0.640 &  0.012\\
 53869.60890 &    0.672 &  0.008\\
 53871.55960 &    0.538 &  0.008\\
 53872.61180 &    0.538 &  0.012\\
 53873.56570 &    0.589 &  0.015\\
 53875.60370 &    0.716 &  0.010\\
 53894.58770 &    0.648 &  0.010\\
 53896.56560 &    0.683 &  0.009\\
 53897.56800 &    0.681 &  0.009\\
 53901.58760 &    0.661 &  0.014\\
 53932.46560 &    0.609 &  0.015\\
 53934.42560 &    0.518 &  0.009\\
\hline
\end{tabular}
\end{table}