\begin{table}%T2
\caption{X-ray sources detected in each energy range.}\label{detections}
\small%\centering
\par
\begin{tabular}{c|cc|ccccc|c}
 \hline\hline
Range (keV) & 0.5--2 & 2--10 & 0.3--0.5 & 0.5--1 & 1--2 & 2--4.5 & 4.5--10 & Total \\ \hline
Field ID & $N$(\%) & $N$(\%) & $N$(\%) & $N$(\%) & $N$(\%) & $N$(\%) & $N$(\%) & $N$ \\ \hline
1 & 37 (74) & 18 (36) & 11 (22) & 25 (50) & 29 (58) & 18 (36) & 1 (2) & 50 \\
2 & 28 (75.7) & 8 (21.6) & 6 (16.2) & 23 (62.2) & 17 (45.9) & 11 (29.7) & 0 (0) & 37 \\
3 & 28 (87.5) & 6 (18.7) & 7 (21.9) & 14 (43.7) & 21 (65.6) & 7 (21.9) & 2 (6.2) & 32 \\
4 & 26 (96.3) & 9 (33.3) & 4 (14.8) & 11 (40.7) & 14 (51.9) & 11 (40.7) & 1 (3.7) & 27 \\ \hline
3EG~J0616$-$3310 & 119 (81.5) & 41 (28.1) & 28 (19.2) & 73 (50) & 81 (55.5) & 47 (32.2) & 4 (2.7) & 146 \\ \hline
5 & 32 (84.2) & 8 (21.1) & 4 (10.5) & 10 (26.3) & 20 (52.6) & 6 (15.8) & 1 (2.6) & 38 \\
6 & 37 (72.5) & 13 (25.5) & 6 (11.8) & 16 (31.4) & 29 (56.9) & 13 (25.5) & 4 (7.8) & 51 \\
7 & 6 (85.7) & 2 (28.6) & 1 (14.3) & 2 (28.6) & 2 (28.6) & 1 (14.3) & 1 (14.3) & 7 \\
8 & 44 (84.6) & 19 (36.5) & 3 (5.8) & 15 (28.8) & 26 (50) & 16 (30.8) & 3 (5.8) & 52 \\ \hline
3EG~J1249$-$8330 & 119 (80.4) & 42 (28.4) & 14 (9.5) & 43 (29.1) & 77 (52) & 36 (24.3) & 8 (5.4) & 148 \\ \hline
\end{tabular}
\end{table}