\begin{table}%t1
%\centering
\par
\caption{Pointings of the CADIS fields.}
         \label{poi}
%\[
\begin{tabular}{rrrrr}
\hline
 %\noalign{\smallskip}
 \hline
 \noalign{\smallskip}
  field & RA & Dec & $l$ & $b$ \\ 
       & \multicolumn{4}{c}{deg}\\
 \noalign{\smallskip}
 \hline
 \noalign{\smallskip}
 1~h &	 27 &	  2 &   150 &	--59 \\
 9~h & 138 &	 46 &	175 &	 45 \\
13~h &	207 &	  6 &	335 &	 60 \\
16~h & 246 &	 56 &	 85 &	 45 \\
23~h & 349 &	 12 &	 90 &	--43 \\
 \noalign{\smallskip}
 \hline
 \end{tabular}
 %\]
\end{table}