\begin{table}%t1
\caption{Parameters of the bona fide and suspected PMS pulsators in IC~4996.}
\label{ic4996-pars}
%\centering
\small
\begin{tabular}{ccccccc}
\hline \hline
Star & WEBDA & Delgado no. & $V$ & $(B-V)$ & $(U-B)$ & Sp\\
& & \# & [mag] & [mag] & [mag] & \\
\hline
37 & 201 & 32 & 15.30 & 0.80 & 0.44 & A5 \\
40 & 171 & 30 & 15.03 & 0.75 & 0.43 & A4 \\
46 & 1085 & 85 & 15.30 & 0.72 & 0.36 & -- \\
\hline
\end{tabular}
\end{table}